From 1d5cace9db9aef76f26b2d7ba54bbb76443b00b2 Mon Sep 17 00:00:00 2001
From: Daniel Baumann <daniel.baumann@progress-linux.org>
Date: Sun, 5 May 2024 20:33:23 +0200
Subject: Adding upstream version 5.0.

Signed-off-by: Daniel Baumann <daniel.baumann@progress-linux.org>
---
 builtins/suspend.def | 128 +++++++++++++++++++++++++++++++++++++++++++++++++++
 1 file changed, 128 insertions(+)
 create mode 100644 builtins/suspend.def

(limited to 'builtins/suspend.def')

diff --git a/builtins/suspend.def b/builtins/suspend.def
new file mode 100644
index 0000000..db28fee
--- /dev/null
+++ b/builtins/suspend.def
@@ -0,0 +1,128 @@
+This file is suspend.def, from which is created suspend.c.
+It implements the builtin "suspend" in Bash.
+
+Copyright (C) 1987-2015 Free Software Foundation, Inc.
+
+This file is part of GNU Bash, the Bourne Again SHell.
+
+Bash is free software: you can redistribute it and/or modify
+it under the terms of the GNU General Public License as published by
+the Free Software Foundation, either version 3 of the License, or
+(at your option) any later version.
+
+Bash is distributed in the hope that it will be useful,
+but WITHOUT ANY WARRANTY; without even the implied warranty of
+MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
+GNU General Public License for more details.
+
+You should have received a copy of the GNU General Public License
+along with Bash.  If not, see <http://www.gnu.org/licenses/>.
+
+$PRODUCES suspend.c
+
+$BUILTIN suspend
+$DEPENDS_ON JOB_CONTROL
+$FUNCTION suspend_builtin
+$SHORT_DOC suspend [-f]
+Suspend shell execution.
+
+Suspend the execution of this shell until it receives a SIGCONT signal.
+Unless forced, login shells cannot be suspended.
+
+Options:
+  -f	force the suspend, even if the shell is a login shell
+
+Exit Status:
+Returns success unless job control is not enabled or an error occurs.
+$END
+
+#include <config.h>
+
+#if defined (JOB_CONTROL)
+#if defined (HAVE_UNISTD_H)
+#  ifdef _MINIX
+#    include <sys/types.h>
+#  endif
+#  include <unistd.h>
+#endif
+
+#include "../bashtypes.h"
+#include <signal.h>
+#include "../bashintl.h"
+#include "../shell.h"
+#include "../jobs.h"
+#include "common.h"
+#include "bashgetopt.h"
+
+static sighandler suspend_continue __P((int));
+
+static SigHandler *old_cont;
+#if 0
+static SigHandler *old_stop;
+#endif
+
+/* Continue handler. */
+static sighandler
+suspend_continue (sig)
+     int sig;
+{
+  set_signal_handler (SIGCONT, old_cont);
+#if 0
+  set_signal_handler (SIGSTOP, old_stop);
+#endif
+  SIGRETURN (0);
+}
+
+/* Suspending the shell.  If -f is the arg, then do the suspend
+   no matter what.  Otherwise, complain if a login shell. */
+int
+suspend_builtin (list)
+     WORD_LIST *list;
+{
+  int opt, force;
+
+  reset_internal_getopt ();
+  force = 0;
+  while ((opt = internal_getopt (list, "f")) != -1)
+    switch (opt)
+      {
+      case 'f':
+	force++;
+	break;
+      CASE_HELPOPT;
+      default:
+	builtin_usage ();
+	return (EX_USAGE);
+      }
+      
+  list = loptend;
+
+  if (job_control == 0)
+    {
+      sh_nojobs (_("cannot suspend"));
+      return (EXECUTION_FAILURE);
+    }
+
+  if (force == 0)  
+    {
+      no_args (list);
+
+      if (login_shell)
+	{
+	  builtin_error (_("cannot suspend a login shell"));
+	  return (EXECUTION_FAILURE);
+	}
+    }
+
+  /* XXX - should we put ourselves back into the original pgrp now?  If so,
+     call end_job_control() here and do the right thing in suspend_continue
+     (that is, call restart_job_control()). */
+  old_cont = (SigHandler *)set_signal_handler (SIGCONT, suspend_continue);
+#if 0
+  old_stop = (SigHandler *)set_signal_handler (SIGSTOP, SIG_DFL);
+#endif
+  killpg (shell_pgrp, SIGSTOP);
+  return (EXECUTION_SUCCESS);
+}
+
+#endif /* JOB_CONTROL */
-- 
cgit v1.2.3

