From 3271d1ac389d2ec93db9c5b9ce0991ce478476cf Mon Sep 17 00:00:00 2001
From: Daniel Baumann <daniel.baumann@progress-linux.org>
Date: Sun, 7 Apr 2024 18:09:41 +0200
Subject: Adding upstream version 4.3.

Signed-off-by: Daniel Baumann <daniel.baumann@progress-linux.org>
---
 doc/faq.adoc | 1049 ++++++++++++++++++++++++++++++++++++++++++++++++++++++++++
 1 file changed, 1049 insertions(+)
 create mode 100644 doc/faq.adoc

(limited to 'doc/faq.adoc')

diff --git a/doc/faq.adoc b/doc/faq.adoc
new file mode 100644
index 0000000..1b299d2
--- /dev/null
+++ b/doc/faq.adoc
@@ -0,0 +1,1049 @@
+// This file is part of chrony
+//
+// Copyright (C) Richard P. Curnow  1997-2003
+// Copyright (C) Miroslav Lichvar  2014-2016, 2020-2022
+//
+// This program is free software; you can redistribute it and/or modify
+// it under the terms of version 2 of the GNU General Public License as
+// published by the Free Software Foundation.
+//
+// This program is distributed in the hope that it will be useful, but
+// WITHOUT ANY WARRANTY; without even the implied warranty of
+// MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the GNU
+// General Public License for more details.
+//
+// You should have received a copy of the GNU General Public License along
+// with this program; if not, write to the Free Software Foundation, Inc.,
+// 51 Franklin Street, Fifth Floor, Boston, MA  02110-1301, USA.
+
+= Frequently Asked Questions
+:toc:
+:numbered:
+
+== `chrony` compared to other programs
+
+=== How does `chrony` compare to `ntpd`?
+
+`chrony` and `ntpd` are two different implementations of the Network Time
+Protocol (NTP).
+
+`chrony` is a newer implementation, which was designed to work well in a wider
+range of conditions. It can usually synchronise the system clock faster and
+with better time accuracy. It has many features, but it does not implement some
+of the less useful NTP modes like broadcast client or multicast server/client.
+
+If your computer is connected to the Internet only for few minutes at a time,
+the network connection is often congested, you turn your computer off or
+suspend it frequently, the clock is not very stable (e.g. there are rapid
+changes in the temperature or it is a virtual machine), or you want to use NTP
+on an isolated network with no hardware reference clocks in sight, `chrony`
+will probably work better for you.
+
+For a more detailed comparison of features and performance, see the
+https://chrony.tuxfamily.org/comparison.html[comparison page] on the `chrony`
+website.
+
+== Configuration issues
+
+=== What is the minimum recommended configuration for an NTP client?
+
+First, the client needs to know which NTP servers it should ask for the current
+time. They are specified by the `server` or `pool` directive. The `pool`
+directive is used with names that resolve to multiple addresses of different
+servers. For reliable operation, the client should have at least three servers.
+
+The `iburst` option enables a burst of requests to speed up the initial
+synchronisation.
+
+To stabilise the initial synchronisation on the next start, the estimated drift
+of the system clock is saved to a file specified by the `driftfile` directive.
+
+If the system clock can be far from the true time after boot for any reason,
+`chronyd` should be allowed to correct it quickly by stepping instead of
+slewing, which would take a very long time. The `makestep` directive does
+that.
+
+In order to keep the real-time clock (RTC) close to the true time, so the
+system time is reasonably close to the true time when it is initialised on the
+next boot from the RTC, the `rtcsync` directive enables a mode in which the
+system time is periodically copied to the RTC. It is supported on Linux and
+macOS.
+
+If you wanted to use public NTP servers from the
+https://www.pool.ntp.org/[pool.ntp.org] project, the minimal _chrony.conf_ file
+could be:
+
+----
+pool pool.ntp.org iburst
+driftfile /var/lib/chrony/drift
+makestep 1 3
+rtcsync
+----
+
+=== How do I make an NTP server?
+
+By default, `chronyd` does not operate as an NTP server. You need to add an
+`allow` directive to the _chrony.conf_ file in order for `chronyd` to open the
+server NTP port and respond to client requests.
+
+----
+allow 192.168.1.0/24
+----
+
+An `allow` directive with no specified subnet allows access from all IPv4 and
+IPv6 addresses.
+
+=== Should all computers on a LAN be clients of an external server?
+
+It depends on the requirements. Usually, the best configuration is to make one
+computer the server, with the others as clients of it. Add a `local` directive
+to the server's _chrony.conf_ file. This configuration will be better because
+
+* the load on the external connection is less
+* the load on the external NTP server(s) is less
+* if your external connection goes down, the computers on the LAN
+  will maintain a common time with each other.
+
+=== Must I specify servers by IP address if DNS is not available on `chronyd` start?
+
+No, `chronyd` will keep trying to resolve
+the names specified by the `server`, `pool`, and `peer` directives in an
+increasing interval until it succeeds. The `online` command can be issued from
+`chronyc` to force `chronyd` to try to resolve the names immediately.
+
+=== How can I make `chronyd` more secure?
+
+If you do not need to use `chronyc`, or you want to run `chronyc` only
+under the root or _chrony_ user (which can access `chronyd` through a Unix
+domain socket), you can disable the IPv4 and IPv6 command sockets (by default
+listening on localhost) by adding `cmdport 0` to the configuration file.
+
+You can specify an unprivileged user with the `-u` option, or the `user`
+directive in the _chrony.conf_ file, to which `chronyd` will switch after start
+in order to drop root privileges. The configure script has a `--with-user`
+option, which sets the default user. On Linux, `chronyd` needs to be compiled
+with support for the `libcap` library. On other systems, `chronyd` forks into
+two processes. The child process retains root privileges, but can only perform
+a very limited range of privileged system calls on behalf of the parent.
+
+Also, if `chronyd` is compiled with support for the Linux secure computing
+(seccomp) facility, you can enable a system call filter with the `-F` option.
+It will significantly reduce the kernel attack surface and possibly prevent
+kernel exploits from the `chronyd` process if it is compromised. It is
+recommended to enable the filter only when it is known to work on the version of
+the system where `chrony` is installed as the filter needs to allow also system
+calls made from libraries that `chronyd` is using (e.g. libc) and different
+versions or implementations of the libraries might make different system calls.
+If the filter is missing some system call, `chronyd` could be killed even in
+normal operation.
+
+=== How can I make the system clock more secure?
+
+An NTP client synchronising the system clock to an NTP server is susceptible to
+various attacks, which can break applications and network protocols relying on
+accuracy of the clock (e.g. DNSSEC, Kerberos, TLS, WireGuard).
+
+Generally, a man-in-the-middle (MITM) attacker between the client and server
+can
+
+* make fake responses, or modify real responses from the server, to create an
+  arbitrarily large time and frequency offset, make the server appear more
+  accurate, insert a leap second, etc.
+* delay the requests and/or responses to create a limited time offset and
+  temporarily also a limited frequency offset
+* drop the requests or responses to prevent updates of the clock with new
+  measurements
+* redirect the requests to a different server
+
+The attacks can be combined for a greater effect. The attacker can delay
+packets to create a significant frequency offset first and then drop all
+subsequent packets to let the clock quickly drift away from the true time.
+The attacker might also be able to control the server's clock.
+
+Some attacks cannot be prevented. Monitoring is needed for detection, e.g. the
+reachability register in the `sources` report shows missing packets. The extent
+to which the attacker can control the client's clock depends on its
+configuration.
+
+Enable authentication to prevent `chronyd` from accepting modified, fake, or
+redirected packets. It can be enabled with a symmetric key specified by the
+`key` option, or Network Time Security (NTS) by the `nts` option (supported
+since `chrony` version 4.0). The server needs to support the selected
+authentication mechanism. Symmetric keys have to be configured on both client
+and server, and each client must have its own key (one per server).
+
+The maximum offset that the attacker can insert in an NTP measurement by
+delaying packets can be limited by the `maxdelay` option. The default value is
+3 seconds. The measured delay is reported as the peer delay in the `ntpdata`
+report and `measurements` log. Set the `maxdelay` option to a value larger than
+the maximum value that is normally observed. Note that the delay can increase
+significantly even when not under an attack, e.g. when the network is congested
+or the routing has changed.
+
+The maximum accepted change in time offset between clock updates can be limited
+by the `maxchange` directive. Larger changes in the offset will be ignored or
+cause `chronyd` to exit. Note that the attacker can get around this limit by
+splitting the offset into multiple smaller offsets and/or creating a large
+frequency offset. When this directive is used, `chronyd` will have to be
+restarted after a successful attack. It will not be able to recover on its own.
+It must not be restarted automatically (e.g. by the service manager).
+
+The impact of a large accepted time offset can be reduced by disabling clock
+steps, i.e. by not using the `makestep` and `initstepslew` directives. The
+offset will be slowly corrected by speeding up or slowing down the clock at a
+rate which can be limited by the `maxslewrate` directive. Disabling clock steps
+completely is practical only if the clock cannot gain a larger error on its
+own, e.g. when the computer is shut down or suspended, and the `maxslewrate`
+limit is large enough to correct an expected error in an acceptable time. The
+`rtcfile` directive with the `-s` option can be used to compensate for the RTC
+drift.
+
+A more practical approach is to enable `makestep` for a limited number of clock
+updates (the 2nd argument of the directive) and limit the offset change in all
+updates by the `maxchange` directive. The attacker will be able to make only a
+limited step and only if the attack starts in a short window after booting the
+computer, or when `chronyd` is restarted without the `-R` option.
+
+The frequency offset can be limited by the `maxdrift` directive. The measured
+frequency offset is reported in the drift file, `tracking` report, and
+`tracking` log. Set `maxdrift` to a value larger than the maximum absolute
+value that is normally observed. Note that the frequency of the clock can
+change due to aging of the crystal, differences in calibration of the clock
+source between reboots, migrated virtual machine, etc. A typical computer clock
+has a drift smaller than 100 parts per million (ppm), but much larger drifts
+are possible (e.g. in some virtual machines).
+
+Use only trusted servers, which you expect to be well configured and managed,
+using authentication for their own servers, etc. Use multiple servers, ideally
+in different locations. The attacker will have to deal with a majority of the
+servers in order to pass the source selection and update the clock with a large
+offset. Use the `minsources` directive to increase the required number of
+selectable sources to make the selection more robust.
+
+Do not specify servers as peers. The symmetric mode is less secure than the
+client/server mode. If not authenticated, it is vulnerable to off-path
+denial-of-service attacks, and even when it is authenticated, it is still
+susceptible to replay attacks.
+
+Mixing of authenticated and unauthenticated servers should generally be
+avoided. If mixing is necessary (e.g. for a more accurate and stable
+synchronisation to a closer server which does not support authentication), the
+authenticated servers should be configured as trusted and required to not allow
+the unauthenticated servers to override the authenticated servers in the source
+selection. Since `chrony` version 4.0, the selection options are enabled in
+such a case automatically. This behaviour can be disabled or modified by the
+`authselmode` directive.
+
+An example of a client configuration limiting the impact of the attacks could
+be
+
+----
+server foo.example.net iburst nts maxdelay 0.1
+server bar.example.net iburst nts maxdelay 0.2
+server baz.example.net iburst nts maxdelay 0.05
+server qux.example.net iburst nts maxdelay 0.1
+server quux.example.net iburst nts maxdelay 0.1
+minsources 3
+maxchange 100 0 0
+makestep 0.001 1
+maxdrift 100
+maxslewrate 100
+driftfile /var/lib/chrony/drift
+ntsdumpdir /var/lib/chrony
+rtcsync
+----
+
+=== How can I improve the accuracy of the system clock with NTP sources?
+
+Select NTP servers that are well synchronised, stable and close to your
+network. It is better to use more than one server. Three or four is usually
+recommended as the minimum, so `chronyd` can detect servers that serve false
+time and combine measurements from multiple sources.
+
+If you have a network card with hardware timestamping supported on Linux, it
+can be enabled by the `hwtimestamp` directive. It should make local receive and
+transmit timestamps of NTP packets much more stable and accurate.
+
+The `server` directive has some useful options: `minpoll`, `maxpoll`,
+`polltarget`, `maxdelay`, `maxdelayratio`, `maxdelaydevratio`, `xleave`,
+`filter`.
+
+The first three options set the minimum and maximum allowed polling interval,
+and how should be the actual interval adjusted in the specified range. Their
+default values are 6 (64 seconds) for `minpoll`, 10 (1024 seconds) for
+`maxpoll` and 8 (samples) for `polltarget`. The default values should be used
+for general servers on the Internet. With your own NTP servers, or if you have
+permission to poll some servers more frequently, setting these options for
+shorter polling intervals might significantly improve the accuracy of the
+system clock.
+
+The optimal polling interval depends mainly on two factors, stability of the
+network latency and stability of the system clock (which mainly depends on the
+temperature sensitivity of the crystal oscillator and the maximum rate of the
+temperature change).
+
+Generally, if the `sourcestats` command usually reports a small number of
+samples retained for a source (e.g. fewer than 16), a shorter polling interval
+should be considered. If the number of samples is usually at the maximum of 64,
+a longer polling interval might work better.
+
+An example of the directive for an NTP server on the Internet that you are
+allowed to poll frequently could be
+
+----
+server foo.example.net minpoll 4 maxpoll 6 polltarget 16
+----
+
+An example using shorter polling intervals with a server located in the same
+LAN could be
+
+----
+server ntp.local minpoll 2 maxpoll 4 polltarget 30
+----
+
+The maxdelay options are useful to ignore measurements with an unusually large
+delay (e.g. due to congestion in the network) and improve the stability of the
+synchronisation. The `maxdelaydevratio` option could be added to the example
+with local NTP server
+
+----
+server ntp.local minpoll 2 maxpoll 4 polltarget 30 maxdelaydevratio 2
+----
+
+If your server supports the interleaved mode (e.g. it is running `chronyd`),
+the `xleave` option should be added to the `server` directive to enable the
+server to provide the client with more accurate transmit timestamps (kernel or
+preferably hardware). For example:
+
+----
+server ntp.local minpoll 2 maxpoll 4 xleave
+----
+
+When combined with local hardware timestamping, good network switches, and even
+shorter polling intervals, a sub-microsecond accuracy and stability of a few
+tens of nanoseconds might be possible. For example:
+
+----
+server ntp.local minpoll 0 maxpoll 0 xleave
+hwtimestamp eth0
+----
+
+For best stability, the CPU should be running at a constant frequency (i.e.
+disabled power saving and performance boosting). Energy-Efficient Ethernet
+(EEE) should be disabled in the network. The switches should be configured to
+prioritize NTP packets, especially if the network is expected to be heavily
+loaded. The `dscp` directive can be used to set the Differentiated Services
+Code Point in transmitted NTP packets if needed.
+
+If it is acceptable for NTP clients in the network to send requests at a high
+rate, a sub-second polling interval can be specified. A median filter
+can be enabled in order to update the clock at a reduced rate with more stable
+measurements. For example:
+
+----
+server ntp.local minpoll -6 maxpoll -6 filter 15 xleave
+hwtimestamp eth0 minpoll -6
+----
+
+Since `chrony` version 4.3, the minimum `minpoll` is -7 and a filter using a
+long-term estimate of a delay quantile can be enabled by the `maxdelayquant`
+option to replace the default `maxdelaydevratio` filter, which is sensitive to
+outliers corrupting the minimum delay. For example:
+
+----
+server ntp.local minpoll -7 maxpoll -7 filter 31 maxdelayquant 0.3 xleave
+----
+
+As an experimental feature added in version 4.2, `chronyd` supports an NTPv4
+extension field containing an additional timestamp to enable frequency transfer
+and significantly improve stability of synchronisation. It can be enabled by
+the `extfield F323` option. For example:
+
+----
+server ntp.local minpoll 0 maxpoll 0 xleave extfield F323
+----
+
+=== Does `chronyd` have an ntpdate mode?
+
+Yes. With the `-q` option `chronyd` will set the system clock once and exit.
+With the `-Q` option it will print the measured offset without setting the
+clock. If you do not want to use a configuration file, NTP servers can be
+specified on the command line. For example:
+
+----
+# chronyd -q 'pool pool.ntp.org iburst'
+----
+
+The command above would normally take about 5 seconds if the servers were
+well synchronised and responding to all requests. If not synchronised or
+responding, it would take about 10 seconds for `chronyd` to give up and exit
+with a non-zero status. A faster configuration is possible. A single server can
+be used instead of four servers, the number of measurements can be reduced with
+the `maxsamples` option to one (supported since `chrony` version 4.0), and a
+timeout can be specified with the `-t` option. The following command would take
+only up to about one second.
+
+----
+# chronyd -q -t 1 'server pool.ntp.org iburst maxsamples 1'
+----
+
+It is not recommended to run `chronyd` with the `-q` option periodically (e.g.
+from a cron job) as a replacement for the daemon mode, because it performs
+significantly worse (e.g. the clock is stepped and its frequency is not
+corrected). If you must run it this way and you are using a public NTP server,
+make sure `chronyd` does not always start around the first second of a minute,
+e.g. by adding a random sleep before the `chronyd` command. Public servers
+typically receive large bursts of requests around the first second as there is
+a large number of NTP clients started from cron with no delay.
+
+=== Can `chronyd` be configured to control the clock like `ntpd`?
+
+It is not possible to perfectly emulate `ntpd`, but there are some options that
+can configure `chronyd` to behave more like `ntpd` if there is a reason to
+prefer that.
+
+In the following example the `minsamples` directive slows down the response to
+changes in the frequency and offset of the clock. The `maxslewrate` and
+`corrtimeratio` directives reduce the maximum frequency error due to an offset
+correction and the `maxdrift` directive reduces the maximum assumed frequency
+error of the clock. The `makestep` directive enables a step threshold and the
+`maxchange` directive enables a panic threshold. The `maxclockerror` directive
+increases the minimum dispersion rate.
+
+----
+minsamples 32
+maxslewrate 500
+corrtimeratio 100
+maxdrift 500
+makestep 0.128 -1
+maxchange 1000 1 1
+maxclockerror 15
+----
+
+Note that increasing `minsamples` might cause the offsets in the `tracking` and
+`sourcestats` reports/logs to be significantly smaller than the actual offsets
+and be unsuitable for monitoring.
+
+=== Can NTP server be separated from NTP client?
+
+Yes, it is possible to run multiple instances of `chronyd` on a computer at the
+same time. One can operate primarily as an NTP client to synchronise the system
+clock and another as a server for other computers. If they use the same
+filesystem, they need to be configured with different pidfiles, Unix domain
+command sockets, and any other file or directory specified in the configuration
+file. If they run in the same network namespace, they need to use different NTP
+and command ports, or bind the ports to different addresses or interfaces.
+
+The server instance should be started with the `-x` option to prevent it from
+adjusting the system clock and interfering with the client instance. It can be
+configured as a client to synchronise its NTP clock to other servers, or the
+client instance running on the same computer. In the latter case, the `copy`
+option (added in `chrony` version 4.1) can be used to assume the reference ID
+and stratum of the client instance, which enables detection of synchronisation
+loops with its own clients.
+
+On Linux, starting with `chrony` version 4.0, it is possible to run multiple
+server instances sharing a port to better utilise multiple cores of the CPU.
+Note that for rate limiting and client/server interleaved mode to work well
+it is necessary that all packets received from the same address are handled by
+the same server instance.
+
+An example configuration of the client instance could be
+
+----
+pool pool.ntp.org iburst
+allow 127.0.0.1
+port 11123
+driftfile /var/lib/chrony/drift
+makestep 1 3
+rtcsync
+----
+
+and configuration of the first server instance could be
+
+----
+server 127.0.0.1 port 11123 minpoll 0 maxpoll 0 copy
+allow
+cmdport 11323
+bindcmdaddress /var/run/chrony/chronyd-server1.sock
+pidfile /var/run/chronyd-server1.pid
+driftfile /var/lib/chrony/drift-server1
+----
+
+=== Should be a leap smear enabled on NTP server?
+
+With the `smoothtime` and `leapsecmode` directives it is possible to enable a
+server leap smear in order to hide leap seconds from clients and force them to
+follow a slow server's adjustment instead.
+
+This feature should be used only in local networks and only when necessary,
+e.g. when the clients cannot be configured to handle the leap seconds as
+needed, or their number is so large that configuring them all would be
+impractical. The clients should use only one leap-smearing server, or multiple
+identically configured leap-smearing servers. Note that some clients can get
+leap seconds from other sources (e.g. with the `leapsectz` directive in
+`chrony`) and they will not work correctly with a leap smearing server.
+
+=== How should `chronyd` be configuration with `gpsd`?
+
+A GPS or other GNSS receiver can be used as a reference clock with `gpsd`. It
+can work as one or two separate time sources for each connected receiver. The
+first time source is based on timestamping of messages sent by the receiver.
+Typically, it is accurate to milliseconds. The other source is much more
+accurate. It is timestamping a pulse-per-second (PPS) signal, usually connected
+to a serial port (e.g. DCD pin) or GPIO pin.
+
+If the PPS signal is connected to the serial port which is receiving messages
+from the GPS/GNSS receiver, `gpsd` should detect and use it automatically. If
+it is connected to a GPIO pin, or another serial port, the PPS device needs to
+be specified on the command line as an additional data source. On Linux, the
+`ldattach` utility can be used to create a PPS device for a serial device.
+
+The message-based time source provided by `gpsd` is specified as a `SHM 0`
+refclock, or other even number if `gpsd` is configured with multiple receivers.
+
+The PPS-based time source is specified as a `SHM 1` refclock (or other odd
+number), or `SOCK /var/run/chrony.DEV.sock` where `DEV` is the name of the
+serial device (e.g. ttyS0).
+
+With `chronyd` and `gpsd` both supporting PPS, and `gpsd` providing two
+different refclocks for PPS, there are three different recommended
+configurations:
+
+----
+# First option
+refclock SOCK /var/run/chrony.ttyS0.sock refid GPS
+
+# Second option
+refclock SHM 1 refid GPS
+
+# Third option
+refclock PPS /dev/pps0 lock NMEA refid GPS
+refclock SHM 0 offset 0.5 delay 0.1 refid NMEA noselect
+----
+
+Each option has some advantages:
+
+* `SOCK` does not use polling (i.e. it can get samples earlier than `SHM`),
+  but it requires `gpsd` to be started after `chronyd` in order to connect to
+  its socket
+* `SOCK` and `SHM 1` can be more accurate than `PPS` if `gpsd` corrects for the
+  sawtooth error provided by the receiver in serial data
+* `PPS` can be used with higher PPS rates (specified by the `rate` option),
+  but it requires a second refclock or another time source to pair pulses
+  with seconds, and the `SHM 0` offset needs to be specified
+  <<using-pps-refclock,correctly>> to compensate for the message delay, while
+  `gpsd` can apply HW-specific information
+
+If the PPS signal is not available, or cannot be used for some reason, the only
+option is the message-based timing
+
+----
+refclock SHM 0 offset 0.5 delay 0.1 refid GPS
+----
+
+=== Does `chrony` support PTP?
+
+No, the Precision Time Protocol (PTP) is not supported as a protocol for
+synchronisation of clocks and there are no plans
+to support it. It is a complex protocol, which shares some issues with the
+NTP broadcast mode. One of the main differences between NTP and PTP is that PTP
+was designed to be easily supported in hardware (e.g. network switches and
+routers) in order to make more stable and accurate measurements. PTP relies on
+the hardware support. NTP does not rely on any support in the hardware, but if
+it had the same support as PTP, it could perform equally well.
+
+On Linux, `chrony` supports hardware clocks that some NICs have for PTP. They
+are called PTP hardware clocks (PHC). They can be used as reference clocks
+(specified by the `refclock` directive) and for hardware timestamping of NTP
+packets (enabled by the `hwtimestamp` directive) if the NIC can timestamp other
+packets than PTP, which is usually the case at least for transmitted packets.
+The `ethtool -T` command can be used to verify the timestamping support.
+
+As an experimental feature added in version 4.2, `chrony` can use PTP as a
+transport for NTP messages (NTP over PTP) to enable hardware timestamping on
+hardware which can timestamp PTP packets only. It can be enabled by the
+`ptpport` directive.
+
+=== Why are client log records dropped before reaching `clientloglimit`?
+
+The number of dropped client log records reported by the `serverstats` command
+can be increasing before the number of clients reported by the `clients` command
+reaches the maximum value corresponding to the memory limit set by the
+`clientloglimit` directive.
+
+This is due to the design of the data structure keeping the client records. It
+is a hash table which can store only up to 16 colliding addresses per slot. If
+a slot has more collisions and the table already has the maximum size, the
+oldest record will be dropped and replaced by the new client.
+
+Note that the size of the table is always a power of two and it can only grow.
+The limit set by the `clientloglimit` directive takes into account that two
+copies of the table exist when it is being resized. This means the actual
+memory usage reported by `top` and other utilities can be significantly smaller
+than the limit even when the maximum number of records is used.
+
+The absolute maximum number of client records kept at the same time is
+16777216.
+
+=== What happened to the `commandkey` and `generatecommandkey` directives?
+
+They were removed in version 2.2. Authentication is no longer supported in the
+command protocol. Commands that required authentication are now allowed only
+through a Unix domain socket, which is accessible only by the root and _chrony_
+users. If you need to configure `chronyd` remotely or locally without the root
+password, please consider using ssh and/or sudo to run `chronyc` under the root
+or _chrony_ user on the host where `chronyd` is running.
+
+== Computer is not synchronising
+
+This is the most common problem. There are a number of reasons, see the
+following questions.
+
+=== Behind a firewall?
+
+Check the `Reach` value printed by the ``chronyc``'s `sources` command. If it
+is zero, it means `chronyd` did not get any valid responses from the NTP server
+you are trying to use. If there is a firewall between you and the server, the
+packets might be blocked. Try using a tool like `wireshark` or `tcpdump` to see
+if you are getting any responses from the server.
+
+When `chronyd` is receiving responses from the servers, the output of the
+`sources` command issued few minutes after `chronyd` start might look like
+this:
+
+----
+MS Name/IP address         Stratum Poll Reach LastRx Last sample
+===============================================================================
+^* foo.example.net               2   6   377    34   +484us[ -157us] +/-   30ms
+^- bar.example.net               2   6   377    34    +33ms[  +32ms] +/-   47ms
+^+ baz.example.net               3   6   377    35  -1397us[-2033us] +/-   60ms
+----
+
+=== Are NTP servers specified with the `offline` option?
+
+Check that the ``chronyc``'s `online` and `offline` commands are used
+appropriately (e.g. in the system networking scripts). The `activity` command
+prints the number of sources that are currently online and offline. For
+example:
+
+----
+200 OK
+3 sources online
+0 sources offline
+0 sources doing burst (return to online)
+0 sources doing burst (return to offline)
+0 sources with unknown address
+----
+
+=== Is name resolution working correctly?
+
+NTP servers specified by their hostname (instead of an IP address) have to have
+their names resolved before `chronyd` can send any requests to them. If the
+`activity` command prints a non-zero number of sources with unknown address,
+there is an issue with the resolution. Typically, a DNS server is specified in
+_/etc/resolv.conf_. Make sure it is working correctly.
+
+Since `chrony` version 4.0, you can run `chronyc -N sources -a` command to
+print all sources, even those that do not have a known address yet, with their
+names as they were specified in the configuration. This can be useful to verify
+that the names specified in the configuration are used as expected.
+
+=== Is `chronyd` allowed to step the system clock?
+
+By default, `chronyd` adjusts the clock gradually by slowing it down or
+speeding it up. If the clock is too far from the true time, it will take
+a long time to correct the error. The `System time` value printed by the
+``chronyc``'s `tracking` command is the remaining correction that needs to be
+applied to the system clock.
+
+The `makestep` directive can be used to allow `chronyd` to step the clock. For
+example, if _chrony.conf_ had
+
+----
+makestep 1 3
+----
+
+the clock would be stepped in the first three updates if its offset was larger
+than one second. Normally, it is recommended to allow the step only in the first
+few updates, but in some cases (e.g. a computer without an RTC or virtual
+machine which can be suspended and resumed with an incorrect time) it might be
+necessary to allow the step on any clock update. The example above would change
+to
+
+----
+makestep 1 -1
+----
+
+=== Using NTS?
+
+The Network Time Security (NTS) mechanism uses Transport Layer Security (TLS)
+to establish the keys needed for authentication of NTP packets.
+
+Run the `authdata` command to check whether the key establishment was
+successful:
+
+----
+# chronyc -N authdata
+Name/IP address             Mode KeyID Type KLen Last Atmp  NAK Cook CLen
+=========================================================================
+foo.example.net              NTS     1   15  256  33m    0    0    8  100
+bar.example.net              NTS     1   15  256  33m    0    0    8  100
+baz.example.net              NTS     1   15  256  33m    0    0    8  100
+----
+
+The KeyID, Type, and KLen columns should have non-zero values. If they are
+zero, check the system log for error messages from `chronyd`. One possible
+cause of failure is a firewall blocking the client's connection to the server's
+TCP port 4460.
+
+Another possible cause of failure is a certificate that is failing to verify
+because the client's clock is wrong. This is a chicken-and-egg problem with NTS.
+You might need to manually correct the date, or temporarily disable NTS, in
+order to get NTS working. If your computer has an RTC and it is backed up by a
+good battery, this operation should be needed only once, assuming the RTC will
+be set periodically with the `rtcsync` directive, or compensated with the
+`rtcfile` directive and the `-s` option.
+
+If the computer does not have an RTC or battery, you can use the `-s` option
+without `rtcfile` directive to restore time of the last shutdown or reboot from
+the drift file. The clock will start behind the true time, but if the computer
+was not shut down for too long and the server's certificate was not renewed too
+close to its expiration, it should be sufficient for the time checks to
+succeed.
+
+If you run your own server, you can use a self-signed certificate covering
+all dates where the client can start (e.g. years 1970-2100). The certificate
+needs to be installed on the client and specified with the `ntstrustedcerts`
+directive. The server can have multiple names and certificates. To avoid
+trusting a certificate for too long, a new certificate can be added to the
+server periodically (e.g. once per year) and the client can have the server
+name and trusted certificate updated automatically (e.g. using a package
+repository, or a cron script downloading the files directly from the server
+over HTTPS). A client that was shut down for years will still be able to
+synchronise its clock and perform the update as long as the server keeps
+the old certificate.
+
+As a last resort, you can disable the time checks by the `nocerttimecheck`
+directive. This has some important security implications. To reduce the
+security risk, you can use the `nosystemcert` and `ntstrustedcerts` directives
+to disable the system's default trusted certificate authorities and trust only
+a minimal set of selected authorities needed to validate the certificates of
+used NTP servers.
+
+=== Using a Windows NTP server?
+
+A common issue with Windows NTP servers is that they report a very large root
+dispersion (e.g. three seconds or more), which causes `chronyd` to ignore the
+server for being too inaccurate. The `sources` command might show a valid
+measurement, but the server is not selected for synchronisation. You can check
+the root dispersion of the server with the ``chronyc``'s `ntpdata` command.
+
+The `maxdistance` value needs to be increased in _chrony.conf_ to enable
+synchronisation to such a server. For example:
+
+----
+maxdistance 16.0
+----
+
+=== An unreachable source is selected?
+
+When `chronyd` is configured with multiple time sources, it tries to select the
+most accurate and stable sources for synchronisation of the system clock. They
+are marked with the _*_ or _+_ symbol in the report printed by the `sources`
+command.
+
+When the best source (marked with the _*_ symbol) becomes unreachable (e.g. NTP
+server stops responding), `chronyd` will not immediately switch
+to the second best source in an attempt to minimise the error of the clock. It
+will let the clock run free for as long as its estimated error (in terms of
+root distance) based on previous measurements is smaller than the estimated
+error of the second source, and there is still an interval which contains some
+measurements from both sources.
+
+If the first source was significantly better than the second source, it can
+take many hours before the second source is selected, depending on its polling
+interval. You can force a faster reselection by increasing the clock error rate
+(`maxclockerror` directive), shortening the polling interval (`maxpoll`
+option), or reducing the number of samples (`maxsamples` option).
+
+=== Does selected source drop new measurements?
+
+`chronyd` can drop a large number of successive NTP measurements if they are
+not passing some of the NTP tests. The `sources` command can report for a
+selected source the fully-reachable value of 377 in the Reach column and at the
+same time a LastRx value that is much larger than the current polling interval.
+If the source is online, this indicates that a number of measurements was
+dropped. You can use the `ntpdata` command to check the NTP tests for the last
+measurement. Usually, it is the test C which fails.
+
+This can be an issue when there is a long-lasting increase in the measured
+delay, e.g. due to a routing change in the network. Unfortunately, `chronyd`
+does not know for how long it should wait for the delay to come back to the
+original values, or whether it is a permanent increase and it should start from
+scratch.
+
+The test C is an adaptive filter. It can take many hours before it accepts
+a measurement with the larger delay, and even much longer before it drops all
+measurements with smaller delay, which determine an expected delay used by the
+test. You can use the `reset sources` command to drop all measurements
+immediately (available in chrony 4.0 and later). If this issue happens
+frequently, you can effectively disable the test by setting the
+`maxdelaydevratio` option to a very large value (e.g. 1000000), or speed up the
+recovery by increasing the clock error rate with the `maxclockerror` directive.
+
+[[using-pps-refclock]]
+=== Using a PPS reference clock?
+
+A pulse-per-second (PPS) reference clock requires a non-PPS time source to
+determine which second of UTC corresponds to each pulse. If it is another
+reference clock specified with the `lock` option in the `refclock` directive,
+the offset between the two reference clocks must be smaller than 0.4 seconds
+(0.2 seconds with `chrony` versions before 4.1) in
+order for the PPS reference clock to work. With NMEA reference clocks it is
+common to have a larger offset. It needs to be corrected with the `offset`
+option.
+
+One approach to find out a good value of the `offset` option is to configure
+the reference clocks with the `noselect` option and compare them to an NTP
+server. For example, if the `sourcestats` command showed
+
+----
+Name/IP Address            NP  NR  Span  Frequency  Freq Skew  Offset  Std Dev
+==============================================================================
+PPS0                        0   0     0     +0.000   2000.000     +0ns  4000ms
+NMEA                       58  30   231    -96.494     38.406   +504ms  6080us
+foo.example.net             7   3   200     -2.991     16.141   -107us   492us
+----
+
+the offset of the NMEA source would need to be increased by about 0.504
+seconds. It does not have to be very accurate. As long as the offset of the
+NMEA reference clock stays below the limit, the PPS reference clock should be
+able to determine the seconds corresponding to the pulses and allow the samples
+to be used for synchronisation.
+
+== Issues with `chronyc`
+
+=== I keep getting the error `506 Cannot talk to daemon`
+
+When accessing `chronyd` remotely, make sure that the _chrony.conf_ file (on
+the computer where `chronyd` is running) has a `cmdallow` entry for the
+computer you are running `chronyc` on and an appropriate `bindcmdaddress`
+directive. This is not necessary for localhost.
+
+Perhaps `chronyd` is not running. Try using the `ps` command (e.g. on Linux,
+`ps -auxw`) to see if it is running. Or try `netstat -a` and see if the UDP
+port 323 is listening. If `chronyd` is not running, you might have a problem
+with the way you are trying to start it (e.g. at boot time).
+
+Perhaps you have a firewall set up in a way that blocks packets on the UDP
+port 323. You need to amend the firewall configuration in this case.
+
+=== I keep getting the error `501 Not authorised`
+
+This error indicates that `chronyc` sent the command to `chronyd` using a UDP
+socket instead of the Unix domain socket (e.g. _/var/run/chrony/chronyd.sock_),
+which is required for some commands. For security reasons, only the root and
+_chrony_ users are allowed to access the socket.
+
+It is also possible that the socket does not exist. `chronyd` will not create
+the socket if the directory has a wrong owner or permissions. In this case
+there should be an error message from `chronyd` in the system log.
+
+=== What is the reference ID reported by the `tracking` command?
+
+The reference ID is a 32-bit value used in NTP to prevent synchronisation
+loops.
+
+In `chrony` versions before 3.0 it was printed in the
+quad-dotted notation, even if the reference source did not actually have an
+IPv4 address. For IPv4 addresses, the reference ID is equal to the address, but
+for IPv6 addresses it is the first 32 bits of the MD5 sum of the address. For
+reference clocks, the reference ID is the value specified with the `refid`
+option in the `refclock` directive.
+
+Since version 3.0, the reference ID is printed as a hexadecimal number to avoid
+confusion with IPv4 addresses.
+
+If you need to get the IP address of the current reference source, use the `-n`
+option to disable resolving of IP addresses and read the second field (printed
+in parentheses) on the `Reference ID` line.
+
+=== Is the `chronyc` / `chronyd` protocol documented anywhere?
+
+Only by the source code. See _cmdmon.c_ (`chronyd` side) and _client.c_
+(`chronyc` side).
+
+Note that this protocol is not compatible with the mode 6 or mode 7 protocol
+supported by `ntpd`, i.e. the `ntpq` or `ntpdc` utility cannot be used to
+monitor `chronyd`, and `chronyc` cannot be used to monitor `ntpd`.
+
+== Real-time clock issues
+
+=== What is the real-time clock (RTC)?
+
+This is the clock which keeps the time even when your computer is turned off.
+It is used to initialise the system clock on boot. It normally does not drift
+more than few seconds per day.
+
+There are two approaches how `chronyd` can work with it. One is to use the
+`rtcsync` directive, which tells `chronyd` to enable a kernel mode which sets
+the RTC from the system clock every 11 minutes. `chronyd` itself will not touch
+the RTC. If the computer is not turned off for a long time, the RTC should
+still be close to the true time when the system clock will be initialised from
+it on the next boot.
+
+The other option is to use the `rtcfile` directive, which tells `chronyd` to
+monitor the rate at which the RTC gains or loses time. When `chronyd` is
+started with the `-s` option on the next boot, it will set the system time from
+the RTC and also compensate for the drift it has measured previously. The
+`rtcautotrim` directive can be used to keep the RTC close to the true time, but
+it is not strictly necessary if its only purpose is to set the system clock when
+`chronyd` is started on boot. See the documentation for details.
+
+=== Does `hwclock` have to be disabled?
+
+The `hwclock` program is run by default in the boot and/or shutdown
+scripts in some Linux installations. With the kernel RTC synchronisation
+(`rtcsync` directive), the RTC will be set also every 11 minutes as long as the
+system clock is synchronised. If you want to use ``chronyd``'s RTC monitoring
+(`rtcfile` directive), it is important to disable `hwclock` in the shutdown
+procedure. If you do not do that, it will overwrite the RTC with a new value, unknown
+to `chronyd`. At the next reboot, `chronyd` started with the `-s` option will
+compensate this (wrong) time with its estimate of how far the RTC has drifted
+whilst the power was off, giving a meaningless initial system time.
+
+There is no need to remove `hwclock` from the boot process, as long as `chronyd`
+is started after it has run.
+
+=== I just keep getting the `513 RTC driver not running` message
+
+For the real-time clock support to work, you need the following three
+things
+
+* an RTC in your computer
+* a Linux kernel with enabled RTC support
+* an `rtcfile` directive in your _chrony.conf_ file
+
+=== I get `Could not open /dev/rtc, Device or resource busy` in my syslog file
+
+Some other program running on the system might be using the device.
+
+=== When I start `chronyd`, the log says `Could not enable RTC interrupt : Invalid argument` (or it may say `disable`)
+
+Your real-time clock hardware might not support the required ioctl requests:
+
+* `RTC_UIE_ON`
+* `RTC_UIE_OFF`
+
+A possible solution could be to build the Linux kernel with support for software
+emulation instead; try enabling the following configuration option when building
+the Linux kernel:
+
+* `CONFIG_RTC_INTF_DEV_UIE_EMUL`
+
+=== What if my computer does not have an RTC or backup battery?
+
+In this case you can still use the `-s` option to set the system clock to the
+last modification time of the drift file, which should correspond to the system
+time when `chronyd` was previously stopped. The initial system time will be
+increasing across reboots and applications started after `chronyd` will not
+observe backward steps.
+
+== NTP-specific issues
+
+=== Can `chronyd` be driven from broadcast/multicast NTP servers?
+
+No, the broadcast/multicast client mode is not supported and there is currently
+no plan to implement it. While this mode can simplify configuration
+of clients in large networks, it is inherently less accurate and less secure
+(even with authentication) than the ordinary client/server mode.
+
+When configuring a large number of clients in a network, it is recommended to
+use the `pool` directive with a DNS name which resolves to addresses of
+multiple NTP servers. The clients will automatically replace the servers when
+they become unreachable, or otherwise unsuitable for synchronisation, with new
+servers from the pool.
+
+Even with very modest hardware, an NTP server can serve time to hundreds of
+thousands of clients using the ordinary client/server mode.
+
+=== Can `chronyd` transmit broadcast NTP packets?
+
+Yes, the `broadcast` directive can be used to enable the broadcast server mode
+to serve time to clients in the network which support the broadcast client mode
+(it is not supported in `chronyd`). Note that this mode should generally be
+avoided. See the previous question.
+
+=== Can `chronyd` keep the system clock a fixed offset away from real time?
+
+Yes. Starting from version 3.0, an offset can be specified by the `offset`
+option for all time sources in the _chrony.conf_ file.
+
+=== What happens if the network connection is dropped without using ``chronyc``'s `offline` command first?
+
+`chronyd` will keep trying to access the sources that it thinks are online, and
+it will take longer before new measurements are actually made and the clock is
+corrected when the network is connected again. If the sources were set to
+offline, `chronyd` would make new measurements immediately after issuing the
+`online` command.
+
+Unless the network connection lasts only few minutes (less than the maximum
+polling interval), the delay is usually not a problem, and it might be acceptable
+to keep all sources online all the time.
+
+=== Why is an offset measured between two computers synchronised to each another?
+
+When two computers are synchronised to each other using the client/server or
+symmetric NTP mode, there is an expectation that NTP measurements between the
+two computers made on both ends show an average offset close to zero.
+
+With `chronyd` that can be expected only when the interleaved mode is enabled
+by the `xleave` option. Otherwise, `chronyd` will use different transmit
+timestamps (e.g. daemon timestamp vs kernel timestamp) for serving time and
+synchronisation of its own clock, which will cause the other computer to
+measure a significant offset.
+
+== Operation
+
+=== What clocks does `chronyd` use?
+
+There are several different clocks used by `chronyd`:
+
+* *System clock:* software clock maintained by the kernel. It is the main clock
+  used by applications running on the computer. It is synchronised by `chronyd`
+  to its NTP clock, unless started with the *-x* option.
+* *NTP clock:* software clock (virtual) based on the system clock and internal
+  to `chronyd`. It keeps the best estimate of the true time according to the
+  configured time sources, which is served to NTP clients unless time smoothing
+  is enabled by the *smoothtime* directive. The *System time* value in the
+  `tracking` report is the current offset between the system and NTP clock.
+* *Real-time clock (RTC):* hardware clock keeping time even when the
+  computer is turned off. It is used by the kernel to initialise the system
+  clock on boot and also by `chronyd` to compensate for its measured drift if
+  configured with the `rtcfile` directive and started with the `-s` option.
+  The clock can be kept accurate only by stepping enabled by the `rtcsync` or
+  `rtcautotrim` directive.
+* *Reference clock:* hardware clock used as a time source. It is specified by
+  the `refclock` directive.
+* *NIC clock (also known as PTP hardware clock):* hardware clock timestamping
+  packets received and transmitted by a network device specified by the
+  *hwtimestamp* directive. The clock is expected to be running free. It is not
+  synchronised by `chronyd`. Its offset is tracked relative to the NTP clock in
+  order to convert the hardware timestamps.
+
+== Operating systems
+
+=== Does `chrony` support Windows?
+
+No. The `chronyc` program (the command-line client used for configuring
+`chronyd` while it is running) has been successfully built and run under
+Cygwin in the past. `chronyd` is not portable, because part of it is
+very system-dependent. It needs adapting to work with Windows'
+equivalent of the adjtimex() call, and it needs to be made to work as a
+service.
+
+=== Are there any plans to support Windows?
+
+We have no plans to do this. Anyone is welcome to pick this work up and
+contribute it back to the project.
-- 
cgit v1.2.3

