From 1660d4b7a65d9ad2ce0deaa19d35579ca4084ac5 Mon Sep 17 00:00:00 2001
From: Daniel Baumann <daniel.baumann@progress-linux.org>
Date: Wed, 17 Apr 2024 10:06:26 +0200
Subject: Adding upstream version 2:2.6.1.

Signed-off-by: Daniel Baumann <daniel.baumann@progress-linux.org>
---
 man/cryptsetup-tcryptDump.8.adoc | 37 +++++++++++++++++++++++++++++++++++++
 1 file changed, 37 insertions(+)
 create mode 100644 man/cryptsetup-tcryptDump.8.adoc

(limited to 'man/cryptsetup-tcryptDump.8.adoc')

diff --git a/man/cryptsetup-tcryptDump.8.adoc b/man/cryptsetup-tcryptDump.8.adoc
new file mode 100644
index 0000000..51d5041
--- /dev/null
+++ b/man/cryptsetup-tcryptDump.8.adoc
@@ -0,0 +1,37 @@
+= cryptsetup-tcryptDump(8)
+:doctype: manpage
+:manmanual: Maintenance Commands
+:mansource: cryptsetup {release-version}
+:man-linkstyle: pass:[blue R < >]
+:COMMON_OPTIONS:
+:ACTION_TCRYPTDUMP:
+
+== Name
+
+cryptsetup-tcryptDump - dump the header information of a TCRYPT (TrueCrypt or VeraCrypt compatible) device
+
+== SYNOPSIS
+
+*cryptsetup _tcryptDump_ [<options>] <device>*
+
+== DESCRIPTION
+
+Dump the header information of a TCRYPT (TrueCrypt or VeraCrypt compatible) device.
+
+If the --dump-volume-key option is used, the TCRYPT device volume key is
+dumped instead of TCRYPT header info. Beware that the volume key (or
+concatenated volume keys if cipher chain is used) can be used to decrypt
+the data stored in the TCRYPT container without a passphrase. This means
+that if the volume key is compromised, the whole device has to be erased
+to prevent further access. Use this option carefully.
+
+*<options>* can be [--dump-volume-key, --key-file, --tcrypt-hidden,
+--tcrypt-system, --tcrypt-backup, --veracrypt (ignored), --disable-veracrypt,
+--veracrypt-pim, --veracrypt-query-pim, --cipher, --hash, --header,
+--verify-passphrase, --timeout].
+
+The keyfile parameter allows a combination of file content with the
+passphrase and can be repeated.
+
+include::man/common_options.adoc[]
+include::man/common_footer.adoc[]
-- 
cgit v1.2.3

