##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : MDEV-<xxxx> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

GCF-1018B : MDEV-18534 wsrep::transaction::adopt(): Assertion `transaction.is_streaming()' failed
GCF-1060 : MDEV-20848 galera_sr.GCF_1060
GCF-585 : MDEV-24698 galera_sr.GCF-585 MTR failed with SIGABRT: no such a transition REPLICATING -> APPLYING
galera-features#56 : MDEV-24896
galera_sr_shutdown_master : MDEV-23612: galera_sr.galera_sr_shutdown_master MTR failed: WSREP_SST: [ERROR] Possible timeout in receving first data from donor in gtid stage
