From 3f619478f796eddbba6e39502fe941b285dd97b1 Mon Sep 17 00:00:00 2001
From: Daniel Baumann <daniel.baumann@progress-linux.org>
Date: Sat, 4 May 2024 20:00:34 +0200
Subject: Adding upstream version 1:10.11.6.

Signed-off-by: Daniel Baumann <daniel.baumann@progress-linux.org>
---
 mysql-test/suite/galera_sr/disabled.def | 17 +++++++++++++++++
 1 file changed, 17 insertions(+)
 create mode 100644 mysql-test/suite/galera_sr/disabled.def

(limited to 'mysql-test/suite/galera_sr/disabled.def')

diff --git a/mysql-test/suite/galera_sr/disabled.def b/mysql-test/suite/galera_sr/disabled.def
new file mode 100644
index 00000000..9cca05eb
--- /dev/null
+++ b/mysql-test/suite/galera_sr/disabled.def
@@ -0,0 +1,17 @@
+##############################################################################
+#
+#  List the test cases that are to be disabled temporarily.
+#
+#  Separate the test case name and the comment with ':'.
+#
+#    <testcasename> : MDEV-<xxxx> <comment>
+#
+#  Do not use any TAB characters for whitespace.
+#
+##############################################################################
+
+GCF-1060 : MDEV-26528 wrong usage of mutex LOCK_thd_kill and LOCK_thd_kill
+galera_sr_cc_master : MDEV-29882 Galera test failure on galera_sr_cc_master
+mysql-wsrep-features#138 : At line 25: query 'DROP TABLE t1' failed: 2013: Lost connection to MySQL server during query
+# Links to below failures in MDEV-30172
+MDEV-25718 : timeout related to wsrep_sync_wait and DEBUG_SYNC
-- 
cgit v1.2.3

