From f7458043ae6a2d2d54b911fac52e50341646bef2 Mon Sep 17 00:00:00 2001
From: Daniel Baumann <daniel.baumann@progress-linux.org>
Date: Wed, 17 Apr 2024 10:35:41 +0200
Subject: Adding upstream version 2:2.7.0.

Signed-off-by: Daniel Baumann <daniel.baumann@progress-linux.org>
---
 man/integritysetup.8.adoc | 4 ++++
 1 file changed, 4 insertions(+)

(limited to 'man/integritysetup.8.adoc')

diff --git a/man/integritysetup.8.adoc b/man/integritysetup.8.adoc
index 2aec1a6..e89b0f7 100644
--- a/man/integritysetup.8.adoc
+++ b/man/integritysetup.8.adoc
@@ -44,6 +44,10 @@ create <name> <device> (*OBSOLETE syntax*)
 
 Open a mapping with <name> backed by device <device>.
 
+If the integrity algorithm of the device is non-default,
+then the algorithm should be specified with the *--integrity* option.
+This will not be detected from the device.
+
 *<options>* can be [--data-device, --batch-mode, --journal-watermark,
 --journal-commit-time, --buffer-sectors, --integrity,
 --integrity-key-size, --integrity-key-file, --integrity-no-journal,
-- 
cgit v1.2.3

