INSERT INTO `icinga_instances`
VALUES (1, 'legacy', 'legacy');

INSERT INTO `icinga_programstatus`
VALUES (1, 1, '0.0.1', '2017-10-10 10:59:47', '2017-10-10 10:59:47', NULL, NULL, 1, 0, 0, NULL, NULL, 1, NULL, 1, 1, 1,
        1, 1, 1, 0, 0, 0, 0, 0, 0, NULL, NULL, 0, NULL);

INSERT INTO `icinga_objects`
VALUES (991, 1, 1, 'host_ok', NULL, 1),
       (992, 1, 1, 'host_down', NULL, 1),
       (993, 1, 1, 'host_s_soft', NULL, 1),
       (994, 1, 2, 'host_ok', 's_ok', 1),
       (995, 1, 2, 'host_down', 's_critical', 1),
       (996, 1, 2, 'host_s_soft', 's_critical_soft', 1),
       (997, 1, 1, 'host_s_critical', NULL, 1),
       (998, 1, 1, 'host_s_warning', NULL, 1),
       (999, 1, 2, 'host_s_critical', 's_critical', 1),
       (9910, 1, 2, 'host_s_warning', 's_warning', 1),
       (9911, 1, 3, 'HG_OK', NULL, 1),
       (9912, 1, 3, 'HG_SOFT', NULL, 1),
       (9913, 1, 3, 'HG_DOWN', NULL, 1),
       (9914, 1, 3, 'HG_CRITICAL', NULL, 1),
       (9915, 1, 3, 'HG_WARNING', NULL, 1),
       (9916, 1, 1, 'host_s_critical_handled', NULL, 1),
       (9917, 1, 1, 'host_s_warning_handled', NULL, 1),
       (9918, 1, 2, 'host_s_critical_handled', 's_critical_handled', 1),
       (9919, 1, 2, 'host_s_warning_handled', 's_warning_handled', 1),
       (9920, 1, 9, '24x7', NULL, 1);

INSERT INTO `icinga_hosts`
VALUES (1, 1, 1, 991, 'host_ok', 'host_ok', '127.0.0.1', '', 0, NULL, 0, NULL, 20, 0, '', 5, 1, 5, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 1, 1, 1, 0, 0, 1, 0, 0, NULL, NULL, NULL, NULL, NULL, NULL, NULL, 0, 0, 0, 0, 0, 0, 0, NULL),
       (2, 1, 1, 992, 'host_down', 'host_down', '127.0.0.1', '', 0, NULL, 0, NULL, 20, 0, '', 5, 1, 5, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 1, 1, 1, 0, 0, 1, 0, 0, NULL, NULL, NULL, NULL, NULL, NULL, NULL, 0, 0, 0, 0, 0, 0, 0, NULL),
       (3, 1, 1, 993, 'host_s_soft', 'host_s_soft', '127.0.0.1', '', 0, NULL, 0, NULL, 20, 0, '', 5, 1, 5, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 1, 1, 1, 0, 0, 1, 0, 0, NULL, NULL, NULL, NULL, NULL, NULL, NULL, 0, 0, 0, 0, 0, 0, 0, NULL),
       (4, 1, 1, 997, 'host_s_critical', 'host_s_critical', '127.0.0.1', '', 0, NULL, 0, NULL, 20, 0, '', 5, 1, 5, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 1, 1, 1, 0, 0, 1, 0, 0, NULL, NULL, NULL, NULL, NULL, NULL, NULL, 0, 0, 0, 0, 0, 0, 0, NULL),
       (5, 1, 1, 998, 'host_s_warning', 'host_s_warning', '127.0.0.1', '', 0, NULL, 0, NULL, 20, 0, '', 5, 1, 5, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 1, 1, 1, 0, 0, 1, 0, 0, NULL, NULL, NULL, NULL, NULL, NULL, NULL, 0, 0, 0, 0, 0, 0, 0, NULL),
       (6, 1, 1, 9916, 'host_s_critical_handled', 'host_s_critical_handled', '127.0.0.1', '', 0, NULL, 0, NULL, 20, 0, '', 5, 1, 5, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 1, 1, 1, 0, 0, 1, 0, 0, NULL, NULL, NULL, NULL, NULL, NULL, NULL, 0, 0, 0, 0, 0, 0, 0, NULL),
       (7, 1, 1, 9917, 'host_s_warning_handled', 'host_s_warning_handled', '127.0.0.1', '', 0, NULL, 0, NULL, 20, 0, '', 5, 1, 5, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 1, 1, 1, 0, 0, 1, 0, 0, NULL, NULL, NULL, NULL, NULL, NULL, NULL, 0, 0, 0, 0, 0, 0, 0, NULL);

INSERT INTO `icinga_hoststatus`
VALUES (1, 1, 991, '2017-10-10 11:01:51', 'TEST', NULL, NULL, '', 0, 1, 0, 1, 5, '2017-10-10 11:01:51', '2017-10-10 11:06:51', 0, '2017-10-10 11:01:51', '2017-10-10 11:01:51', 0, '2017-10-10 11:01:51', NULL, NULL, 1, NULL, NULL, 0, 1, 0, 0, 0, 1, 1, 1, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, NULL, NULL, NULL, 0, 0, 0, 0, NULL),
       (2, 1, 992, '2017-10-10 11:01:51', 'TEST', NULL, NULL, '', 1, 1, 0, 1, 5, '2017-10-10 11:01:51', '2017-10-10 11:06:51', 0, '2017-10-10 11:01:51', '2017-10-10 11:01:51', 1, '2017-10-10 11:01:51', '2017-10-10 11:01:51', NULL, 1, NULL, NULL, 0, 1, 0, 0, 0, 1, 1, 1, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, NULL, NULL, NULL, 0, 0, 0, 0, NULL),
       (3, 1, 993, '2017-10-10 11:01:51', 'TEST', NULL, NULL, '', 0, 1, 0, 1, 5, '2017-10-10 11:01:51', '2017-10-10 11:06:51', 0, '2017-10-10 11:01:51', '2017-10-10 11:01:51', 0, '2017-10-10 11:01:51', NULL, NULL, 1, NULL, NULL, 0, 1, 0, 0, 0, 1, 1, 1, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, NULL, NULL, NULL, 0, 0, 0, 0, NULL),
       (4, 1, 997, '2017-10-10 11:01:51', 'TEST', NULL, NULL, '', 0, 1, 0, 1, 5, '2017-10-10 11:01:51', '2017-10-10 11:06:51', 0, '2017-10-10 11:01:51', '2017-10-10 11:01:51', 0, '2017-10-10 11:01:51', NULL, NULL, 1, NULL, NULL, 0, 1, 0, 0, 0, 1, 1, 1, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, NULL, NULL, NULL, 0, 0, 0, 0, NULL),
       (5, 1, 998, '2017-10-10 11:01:51', 'TEST', NULL, NULL, '', 0, 1, 0, 1, 5, '2017-10-10 11:01:51', '2017-10-10 11:06:51', 0, '2017-10-10 11:01:51', '2017-10-10 11:01:51', 0, '2017-10-10 11:01:51', NULL, NULL, 1, NULL, NULL, 0, 1, 0, 0, 0, 1, 1, 1, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, NULL, NULL, NULL, 0, 0, 0, 0, NULL),
       (6, 1, 9916, '2017-10-10 11:01:51', 'TEST', NULL, NULL, '', 0, 1, 0, 1, 5, '2017-10-10 11:01:51', '2017-10-10 11:06:51', 0, '2017-10-10 11:01:51', '2017-10-10 11:01:51', 0, '2017-10-10 11:01:51', NULL, NULL, 1, NULL, NULL, 0, 1, 0, 0, 0, 1, 1, 1, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, NULL, NULL, NULL, 0, 0, 0, 0, NULL),
       (7, 1, 9917, '2017-10-10 11:01:51', 'TEST', NULL, NULL, '', 0, 1, 0, 1, 5, '2017-10-10 11:01:51', '2017-10-10 11:06:51', 0, '2017-10-10 11:01:51', '2017-10-10 11:01:51', 0, '2017-10-10 11:01:51', NULL, NULL, 1, NULL, NULL, 0, 1, 0, 0, 0, 1, 1, 1, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, NULL, NULL, NULL, 0, 0, 0, 0, NULL);

INSERT INTO `icinga_services`
VALUES (1, 1, 1, 991, 994, 's_ok', 0, NULL, 0, NULL, 20, 0, '', 5, 1, 5, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 1, 0, 0, 0, 0, 0, 0, 0, 0, 0, 1, 1, 1, 0, 0, 1, 0, 0, NULL, NULL, NULL, NULL, NULL, NULL),
       (2, 1, 1, 992, 995, 's_critical', 0, NULL, 0, NULL, 20, 0, '', 5, 1, 5, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 1, 0, 0, 0, 0, 0, 0, 0, 0, 0, 1, 1, 1, 0, 0, 1, 0, 0, NULL, NULL, NULL, NULL, NULL, NULL),
       (3, 1, 1, 993, 996, 's_critical_soft', 0, NULL, 0, NULL, 20, 0, '', 5, 1, 5, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 1, 0, 0, 0, 0, 0, 0, 0, 0, 0, 1, 1, 1, 0, 0, 1, 0, 0, NULL, NULL, NULL, NULL, NULL, NULL),
       (4, 1, 1, 997, 999, 's_critical', 0, NULL, 0, NULL, 20, 0, '', 5, 1, 5, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 1, 0, 0, 0, 0, 0, 0, 0, 0, 0, 1, 1, 1, 0, 0, 1, 0, 0, NULL, NULL, NULL, NULL, NULL, NULL),
       (5, 1, 1, 998, 9910, 's_warning', 0, NULL, 0, NULL, 20, 0, '', 5, 1, 5, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 1, 0, 0, 0, 0, 0, 0, 0, 0, 0, 1, 1, 1, 0, 0, 1, 0, 0, NULL, NULL, NULL, NULL, NULL, NULL),
       (6, 1, 1, 9916, 9918, 's_critical_handled', 0, NULL, 0, NULL, 20, 0, '', 5, 1, 5, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 1, 0, 0, 0, 0, 0, 0, 0, 0, 0, 1, 1, 1, 0, 0, 1, 0, 0, NULL, NULL, NULL, NULL, NULL, NULL),
       (7, 1, 1, 9917, 9919, 's_warning_handled', 0, NULL, 0, NULL, 20, 0, '', 5, 1, 5, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 1, 0, 0, 0, 0, 0, 0, 0, 0, 0, 1, 1, 1, 0, 0, 1, 0, 0, NULL, NULL, NULL, NULL, NULL, NULL);

INSERT INTO `icinga_servicestatus`
VALUES (1, 1, 994, '2017-10-10 11:16:38', 'TEST', NULL, NULL, '', 0, 1, 0, 1, 5, '2017-10-10 11:17:01', '2017-10-10 11:22:03', 1, '2017-10-10 11:17:11', '2017-10-10 11:17:11', 0, '2017-10-10 11:17:11', NULL, NULL, NULL, 1, NULL, NULL, 0, 1, 0, 0, 0, 1, 1, 1, 1, 0, 0, 0, 0, 0, 0, 0, 0, 0, NULL, NULL, NULL, 5, 1, 0, 0, NULL),
       (2, 1, 995, '2017-10-10 11:16:38', 'TEST', NULL, NULL, '', 2, 1, 0, 1, 5, '2017-10-10 11:17:01', '2017-10-10 11:22:03', 1, '2017-10-10 11:17:11', '2017-10-10 11:17:11', 1, '2017-10-10 11:17:11', NULL, NULL, NULL, 1, NULL, NULL, 0, 1, 0, 0, 0, 1, 1, 1, 1, 0, 0, 0, 0, 0, 0, 0, 0, 0, NULL, NULL, NULL, 5, 1, 0, 0, NULL),
       (3, 1, 996, '2017-10-10 11:16:38', 'TEST', NULL, NULL, '', 2, 1, 0, 1, 5, '2017-10-10 11:17:01', '2017-10-10 11:22:03', 1, '2017-10-10 11:17:11', '2017-10-10 11:17:11', 0, '2017-10-10 11:17:11', NULL, NULL, NULL, 0, NULL, NULL, 0, 1, 0, 0, 0, 1, 1, 1, 1, 0, 0, 0, 0, 0, 0, 0, 0, 0, NULL, NULL, NULL, 5, 1, 0, 0, NULL),
       (4, 1, 999, '2017-10-10 11:16:38', 'TEST', NULL, NULL, '', 2, 1, 0, 1, 5, '2017-10-10 11:17:01', '2017-10-10 11:22:03', 1, '2017-10-10 11:17:11', '2017-10-10 11:17:11', 2, '2017-10-10 11:17:11', NULL, NULL, NULL, 1, NULL, NULL, 0, 1, 0, 0, 0, 1, 1, 1, 1, 0, 0, 0, 0, 0, 0, 0, 0, 0, NULL, NULL, NULL, 5, 1, 0, 0, NULL),
       (5, 1, 9910, '2017-10-10 11:16:38', 'TEST', NULL, NULL, '', 1, 1, 0, 1, 5, '2017-10-10 11:17:01', '2017-10-10 11:22:03', 1, '2017-10-10 11:17:11', '2017-10-10 11:17:11', 1, '2017-10-10 11:17:11', NULL, NULL, NULL, 1, NULL, NULL, 0, 1, 0, 0, 0, 1, 1, 1, 1, 0, 0, 0, 0, 0, 0, 0, 0, 0, NULL, NULL, NULL, 5, 1, 0, 0, NULL),
       (6, 1, 9919, '2017-10-10 11:16:38', 'TEST', NULL, NULL, '', 1, 1, 0, 1, 5, '2017-10-10 11:17:01', '2017-10-10 11:22:03', 1, '2017-10-10 11:17:11', '2017-10-10 11:17:11', 1, '2017-10-10 11:17:11', NULL, NULL, NULL, 1, NULL, NULL, 0, 1, 1, 3, 0, 1, 1, 1, 1, 0, 0, 0, 0, 0, 0, 0, 0, 0, NULL, NULL, NULL, 5, 1, 0, 0, NULL),
       (7, 1, 9918, '2017-10-10 11:16:38', 'TEST', NULL, NULL, '', 2, 1, 0, 1, 5, '2017-10-10 11:17:01', '2017-10-10 11:22:03', 1, '2017-10-10 11:17:11', '2017-10-10 11:17:11', 1, '2017-10-10 11:17:11', NULL, NULL, NULL, 1, NULL, NULL, 0, 1, 1, 3, 0, 1, 1, 1, 1, 0, 0, 0, 0, 0, 0, 0, 0, 0, NULL, NULL, NULL, 5, 1, 0, 0, NULL);

INSERT INTO `icinga_hostgroups`
VALUES (1, 1, 1, 9911, 'HG_OK', NULL, NULL, NULL, NULL),
       (2, 1, 1, 9912, 'HG_SOFT', NULL, NULL, NULL, NULL),
       (3, 1, 1, 9913, 'HG_DOWN', NULL, NULL, NULL, NULL),
       (4, 1, 1, 9914, 'HG_CRITICAL', NULL, NULL, NULL, NULL),
       (5, 1, 1, 9915, 'HG_WARNING', NULL, NULL, NULL, NULL);

INSERT INTO `icinga_hostgroup_members`
VALUES (1, 1, 1, 991),
       (2, 1, 2, 993),
       (3, 1, 3, 992),
       (4, 1, 4, 997),
       (5, 1, 5, 998);
