##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : MDEV-<xxxx> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

galera_2_cluster : MDEV-32631 galera_2_cluster: before_rollback(): Assertion `0' failed
galera_gtid_2_cluster : MDEV-32633 galera_gtid_2_cluster: Assertion `thd->wsrep_next_trx_id() != (0x7fffffffffffffffLL * 2ULL + 1)'
galera_ssl_reload : MDEV-32778 galera_ssl_reload failed with warning message
galera_ipv6_mariabackup : temporarily disabled at the request of Codership
galera_pc_bootstrap : temporarily disabled at the request of Codership
galera_ipv6_mariabackup_section : temporarily disabled at the request of Codership
# Opensuse/suse/rocky9/rocky84/rhel9/rhel8-ppc64le .. - all same IPv6 isn't configured right or skipping or galera
galera_ipv6_rsync : Can't connect to server on '::1' (115)
galera_ipv6_rsync_section : Can't connect to server on '::1' (115)
GCF-354 : MDEV-25614 Galera test failure on GCF-354
