Test Callouts
=============

.MS-DOS directory listing
.....................................................
10/17/97   9:04         <DIR>    bin
10/16/97  14:11         <DIR>    DOS            <1>
10/16/97  14:40         <DIR>    Program Files
10/16/97  14:46         <DIR>    TEMP
10/17/97   9:04         <DIR>    tmp
10/16/97  14:37         <DIR>    WINNT
10/16/97  14:25             119  AUTOEXEC.BAT   <2>
 2/13/94   6:21          54,619  COMMAND.COM    <2>
10/16/97  14:25             115  CONFIG.SYS     <2>
11/16/97  17:17      61,865,984  pagefile.sys
 2/13/94   6:21           9,349  WINA20.386     <3>
.....................................................

<1> This directory holds MS-DOS.
<2> System startup code for DOS.
<3> Some sort of Windows 3.1 hack.


[source,shell]
....
# Generate the FreeBSD website
#
# Copyright (c) 2020-2021, The FreeBSD Documentation Project <.>
#
# Targets intended for use on the command line <.>
#
# all (default)	-	generate the releases.toml and compile all the website
# run	-			serves the built website for local browsing
#
# The run target uses hugo's built-in webserver to make the built website
# available for local browsing.  The website should have been built prior
# to attempting to use the `run` target.  By default, hugo will start its
# webserver on port 1313. <.>
....
<.> Callout 1.
<.> Callout 2.
<.> Callout 3.
