From 1272be04be0cb803eec87f602edb2e3e6f111aea Mon Sep 17 00:00:00 2001
From: Daniel Baumann <daniel.baumann@progress-linux.org>
Date: Sun, 14 Apr 2024 21:33:34 +0200
Subject: Merging upstream version 2.40.

Signed-off-by: Daniel Baumann <daniel.baumann@progress-linux.org>
---
 misc-utils/uuidd.8.adoc | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'misc-utils/uuidd.8.adoc')

diff --git a/misc-utils/uuidd.8.adoc b/misc-utils/uuidd.8.adoc
index b0f4850..c1c6625 100644
--- a/misc-utils/uuidd.8.adoc
+++ b/misc-utils/uuidd.8.adoc
@@ -27,9 +27,9 @@ The *uuidd* daemon is used by the UUID library to generate universally unique id
 *-C*, *--cont-clock*[=_time_]::
 Activate continuous clock handling for time based UUIDs. *uuidd* could use all possible clock values, beginning with the daemon's start time. The optional argument can be used to set a value for the max_clock_offset. This gurantees, that a clock value of a UUID will always be within the range of the max_clock_offset.
 +
-The option '-C' or '--cont-clock' enables the feature with a default max_clock_offset of 2 hours.
+The option *-C* or *--cont-clock* enables the feature with a default max_clock_offset of 2 hours.
 +
-The option '-C<NUM>[hd]' or '--cont-clock=<NUM>[hd]' enables the feature with a max_clock_offset of NUM seconds. In case of an appended h or d, the NUM value is read in hours or days. The minimum value is 60 seconds, the maximum value is 365 days.
+The option *-C<NUM>[hd]* or *--cont-clock=<NUM>[hd]* enables the feature with a max_clock_offset of NUM seconds. In case of an appended h or d, the NUM value is read in hours or days. The minimum value is 60 seconds, the maximum value is 365 days.
 
 *-d*, *--debug*::
 Run *uuidd* in debugging mode. This prevents *uuidd* from running as a daemon.
-- 
cgit v1.2.3

