From c61e14d3a8412cd50d98aab604e607692c844c8a Mon Sep 17 00:00:00 2001
From: Daniel Baumann <daniel.baumann@progress-linux.org>
Date: Sun, 14 Apr 2024 21:33:30 +0200
Subject: Adding upstream version 2.40.

Signed-off-by: Daniel Baumann <daniel.baumann@progress-linux.org>
---
 sys-utils/chcpu.8.adoc | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'sys-utils/chcpu.8.adoc')

diff --git a/sys-utils/chcpu.8.adoc b/sys-utils/chcpu.8.adoc
index c5797df..80dfc5f 100644
--- a/sys-utils/chcpu.8.adoc
+++ b/sys-utils/chcpu.8.adoc
@@ -37,6 +37,8 @@ Enable the specified CPUs. Enabling a CPU means that the kernel sets it online.
 
 *-g*, *--deconfigure* _cpu-list_::
 Deconfigure the specified CPUs. Deconfiguring a CPU means that the hypervisor removes the CPU from the virtual hardware on which the Linux instance runs and returns it to the CPU pool. A CPU must be offline, see *-d*, before it can be deconfigured.
++
+*chcpu -g* is not supported on IBM z/VM, CPUs are always in a configured.
 
 *-p*, *--dispatch* _mode_::
 Set the CPU dispatching _mode_ (polarization). This option has an effect only if your hardware architecture and hypervisor support CPU polarization. Available _modes_ are:
-- 
cgit v1.2.3

