From e4ba6dbc3f1e76890b22773807ea37fe8fa2b1bc Mon Sep 17 00:00:00 2001
From: Daniel Baumann <daniel.baumann@progress-linux.org>
Date: Wed, 10 Apr 2024 22:34:10 +0200
Subject: Adding upstream version 4.2.2.

Signed-off-by: Daniel Baumann <daniel.baumann@progress-linux.org>
---
 doc/udpdump.adoc | 121 +++++++++++++++++++++++++++++++++++++++++++++++++++++++
 1 file changed, 121 insertions(+)
 create mode 100644 doc/udpdump.adoc

(limited to 'doc/udpdump.adoc')

diff --git a/doc/udpdump.adoc b/doc/udpdump.adoc
new file mode 100644
index 0000000..8739ab6
--- /dev/null
+++ b/doc/udpdump.adoc
@@ -0,0 +1,121 @@
+include::../docbook/attributes.adoc[]
+= udpdump(1)
+:doctype: manpage
+:stylesheet: ws.css
+:linkcss:
+:copycss: ../docbook/{stylesheet}
+
+== NAME
+
+udpdump - Provide a UDP receiver that gets packets from network devices (like Aruba routers) and exports them in PCAP format.
+
+== SYNOPSIS
+
+[manarg]
+*udpdump*
+[ *--help* ]
+[ *--version* ]
+[ *--extcap-interfaces* ]
+[ *--extcap-dlts* ]
+[ *--extcap-interface*=<interface> ]
+[ *--extcap-config* ]
+[ *--capture* ]
+[ *--fifo*=<path to file or pipe> ]
+[ *--port*=<port> ]
+[ *--payload*=<type> ]
+
+== DESCRIPTION
+
+*udpdump* is a extcap tool that provides a UDP receiver that listens for exported datagrams coming from
+any source (like Aruba routers) and exports them in PCAP format. This provides the user two basic
+functionalities: the first one is to have a listener that prevents the localhost to send back an ICMP
+port-unreachable packet. The second one is to strip out the lower layers (layer 2, IP, UDP) that are useless
+(are used just as export vector). The format of the exported datagrams are EXPORTED_PDU, as specified in
+https://gitlab.com/wireshark/wireshark/-/raw/master/epan/exported_pdu.h
+
+== OPTIONS
+
+--help::
+Print program arguments.
+
+--version::
+Print program version.
+
+--extcap-interfaces::
+List available interfaces.
+
+--extcap-interface=<interface>::
+Use specified interfaces.
+
+--extcap-dlts::
+List DLTs of specified interface.
+
+--extcap-config::
+List configuration options of specified interface.
+
+--capture::
+Start capturing from specified interface save saved it in place specified by --fifo.
+
+--fifo=<path to file or pipe>::
+Save captured packet to file or send it through pipe.
+
+--port=<port>::
+Set the listener port. Port 5555 is the default.
+
+--payload=<type>::
+Set the payload of the exported PDU. Default: data.
+
+== EXAMPLES
+
+To see program arguments:
+
+    udpdump --help
+
+To see program version:
+
+    udpdump --version
+
+To see interfaces:
+
+    udpdump --extcap-interfaces
+
+.Example output
+    interface {value=udpdump}{display=UDP Listener remote capture}
+
+To see interface DLTs:
+
+    udpdump --extcap-interface=udpdump --extcap-dlts
+
+.Example output
+    dlt {number=252}{name=udpdump}{display=Exported PDUs}
+
+To see interface configuration options:
+
+    udpdump --extcap-interface=udpdump --extcap-config
+
+.Example output
+    arg {number=0}{call=--port}{display=Listen port}{type=unsigned}{range=1,65535}{default=5555}{tooltip=The port the receiver listens on}
+
+To capture:
+
+    udpdump --extcap-interface=randpkt --fifo=/tmp/randpkt.pcapng --capture
+
+NOTE: To stop capturing CTRL+C/kill/terminate the application.
+
+== SEE ALSO
+
+xref:wireshark.html[wireshark](1), xref:tshark.html[tshark](1), xref:dumpcap.html[dumpcap](1), xref:extcap.html[extcap](4)
+
+== NOTES
+
+*udpdump* is part of the *Wireshark* distribution.  The latest version
+of *Wireshark* can be found at https://www.wireshark.org.
+
+HTML versions of the Wireshark project man pages are available at
+https://www.wireshark.org/docs/man-pages.
+
+== AUTHORS
+
+.Original Author
+[%hardbreaks]
+Dario Lombardo <lomato[AT]gmail.com>
-- 
cgit v1.2.3

