From 378c18e5f024ac5a8aef4cb40d7c9aa9633d144c Mon Sep 17 00:00:00 2001
From: Daniel Baumann <daniel.baumann@progress-linux.org>
Date: Sun, 7 Apr 2024 16:30:35 +0200
Subject: Adding upstream version 2.38.1.

Signed-off-by: Daniel Baumann <daniel.baumann@progress-linux.org>
---
 sys-utils/rfkill.8.adoc | 90 +++++++++++++++++++++++++++++++++++++++++++++++++
 1 file changed, 90 insertions(+)
 create mode 100644 sys-utils/rfkill.8.adoc

(limited to 'sys-utils/rfkill.8.adoc')

diff --git a/sys-utils/rfkill.8.adoc b/sys-utils/rfkill.8.adoc
new file mode 100644
index 0000000..2086798
--- /dev/null
+++ b/sys-utils/rfkill.8.adoc
@@ -0,0 +1,90 @@
+//po4a: entry man manual
+= rfkill(8)
+:doctype: manpage
+:man manual: System Administration
+:man source: util-linux {release-version}
+:page-layout: base
+:command: rfkill
+
+== NAME
+
+rfkill - tool for enabling and disabling wireless devices
+
+== SYNOPSIS
+
+*rfkill* [options] [_command_] [_ID_|_type_ ...]
+
+== DESCRIPTION
+
+*rfkill* lists, enabling and disabling wireless devices.
+
+The command "list" output format is deprecated and maintained for backward compatibility only. The new output format is the default when no command is specified or when the option *--output* is used.
+
+The default output is subject to change. So whenever possible, you should avoid using default outputs in your scripts. Always explicitly define expected columns by using the *--output* option together with a columns list in environments where a stable output is required.
+
+== OPTIONS
+
+*-J*, *--json*::
+Use JSON output format.
+
+*-n*, *--noheadings*::
+Do not print a header line.
+
+*-o*, *--output*::
+Specify which output columns to print. Use *--help* to get a list of available columns.
+
+*--output-all*::
+Output all available columns.
+
+*-r*, *--raw*::
+Use the raw output format.
+
+include::man-common/help-version.adoc[]
+
+== COMMANDS
+
+*help*::
+Display help text and exit.
+
+*event*::
+Listen for rfkill events and display them on stdout.
+
+*list* [__id__|__type__ ...]::
+List the current state of all available devices. The command output format is deprecated, see the *DESCRIPTION* section. It is a good idea to check with *list* command _id_ or _type_ scope is appropriate before setting *block* or *unblock*. Special _all_ type string will match everything. Use of multiple _ID_ or _type_ arguments is supported.
+
+**block** __id__|__type__ [...]::
+Disable the corresponding device.
+
+**unblock** __id__|__type__ [...]::
+Enable the corresponding device. If the device is hard-blocked, for example via a hardware switch, it will remain unavailable though it is now soft-unblocked.
+
+**toggle** __id__|__type__ [...]::
+Enable or disable the corresponding device.
+
+== EXAMPLE
+....
+  rfkill --output ID,TYPE
+  rfkill block all
+  rfkill unblock wlan
+  rfkill block bluetooth uwb wimax wwan gps fm nfc
+....
+
+== AUTHORS
+
+*rfkill* was originally written by mailto:johannes@sipsolutions.net[Johannes Berg] and mailto:marcel@holtmann.org[Marcel Holtmann]. The code has been later modified by mailto:kerolasa@iki.fi[Sami Kerola] and mailto:kzak@redhat.com[Karel Zak] for the util-linux project.
+
+This manual page was written by mailto:linux@youmustbejoking.demon.co.uk[Darren Salt] for the Debian project (and may be used by others).
+
+== SEE ALSO
+
+*powertop*(8),
+*systemd-rfkill*(8),
+https://git.kernel.org/pub/scm/linux/kernel/git/torvalds/linux.git/tree/Documentation/driver-api/rfkill.rst[Linux kernel documentation]
+
+include::man-common/bugreports.adoc[]
+
+include::man-common/footer.adoc[]
+
+ifdef::translation[]
+include::man-common/translation.adoc[]
+endif::[]
-- 
cgit v1.2.3

