From 1660d4b7a65d9ad2ce0deaa19d35579ca4084ac5 Mon Sep 17 00:00:00 2001
From: Daniel Baumann <daniel.baumann@progress-linux.org>
Date: Wed, 17 Apr 2024 10:06:26 +0200
Subject: Adding upstream version 2:2.6.1.

Signed-off-by: Daniel Baumann <daniel.baumann@progress-linux.org>
---
 man/cryptsetup-isLuks.8.adoc | 29 +++++++++++++++++++++++++++++
 1 file changed, 29 insertions(+)
 create mode 100644 man/cryptsetup-isLuks.8.adoc

(limited to 'man/cryptsetup-isLuks.8.adoc')

diff --git a/man/cryptsetup-isLuks.8.adoc b/man/cryptsetup-isLuks.8.adoc
new file mode 100644
index 0000000..aac559c
--- /dev/null
+++ b/man/cryptsetup-isLuks.8.adoc
@@ -0,0 +1,29 @@
+= cryptsetup-isLuks(8)
+:doctype: manpage
+:manmanual: Maintenance Commands
+:mansource: cryptsetup {release-version}
+:man-linkstyle: pass:[blue R < >]
+:COMMON_OPTIONS:
+:ACTION_ISLUKS:
+
+== Name
+
+cryptsetup-isLuks - check if a device is a LUKS device
+
+== SYNOPSIS
+
+*cryptsetup _isLuks_ [<options>] <device>*
+
+== DESCRIPTION
+
+Returns true, if <device> is a LUKS device, false otherwise.
+
+Use option -v to get human-readable feedback.
+'Command successful.' means the device is a LUKS device.
+
+By specifying --type you may query for specific LUKS version.
+
+*<options>* can be [--header, --type, --disable-locks].
+
+include::man/common_options.adoc[]
+include::man/common_footer.adoc[]
-- 
cgit v1.2.3

