From 378c18e5f024ac5a8aef4cb40d7c9aa9633d144c Mon Sep 17 00:00:00 2001
From: Daniel Baumann <daniel.baumann@progress-linux.org>
Date: Sun, 7 Apr 2024 16:30:35 +0200
Subject: Adding upstream version 2.38.1.

Signed-off-by: Daniel Baumann <daniel.baumann@progress-linux.org>
---
 sys-utils/rtcwake.8.adoc | 142 +++++++++++++++++++++++++++++++++++++++++++++++
 1 file changed, 142 insertions(+)
 create mode 100644 sys-utils/rtcwake.8.adoc

(limited to 'sys-utils/rtcwake.8.adoc')

diff --git a/sys-utils/rtcwake.8.adoc b/sys-utils/rtcwake.8.adoc
new file mode 100644
index 0000000..481a586
--- /dev/null
+++ b/sys-utils/rtcwake.8.adoc
@@ -0,0 +1,142 @@
+//po4a: entry man manual
+= rtcwake(8)
+:doctype: manpage
+:man manual: System Administration
+:man source: util-linux {release-version}
+:page-layout: base
+:command: rtcwake
+
+== NAME
+
+rtcwake - enter a system sleep state until specified wakeup time
+
+== SYNOPSIS
+
+*rtcwake* [options] [*-d* _device_] [*-m* _standby_mode_] {*-s* _seconds_|*-t* _time_t_}
+
+== DESCRIPTION
+
+This program is used to enter a system sleep state and to automatically wake from it at a specified time.
+
+This uses cross-platform Linux interfaces to enter a system sleep state, and leave it no later than a specified time. It uses any RTC framework driver that supports standard driver model wakeup flags.
+
+This is normally used like the old *apmsleep* utility, to wake from a suspend state like ACPI S1 (standby) or S3 (suspend-to-RAM). Most platforms can implement those without analogues of BIOS, APM, or ACPI.
+
+On some systems, this can also be used like *nvram-wakeup*, waking from states like ACPI S4 (suspend to disk). Not all systems have persistent media that are appropriate for such suspend modes.
+
+Note that alarm functionality depends on hardware; not every RTC is able to setup an alarm up to 24 hours in the future.
+
+The suspend setup may be interrupted by active hardware; for example wireless USB input devices that continue to send events for some fraction of a second after the return key is pressed. *rtcwake* tries to avoid this problem and it waits to the terminal to settle down before entering a system sleep.
+
+== OPTIONS
+
+*-A*, *--adjfile* _file_::
+Specify an alternative path to the adjust file.
+
+*-a*, *--auto*::
+Read the clock mode (whether the hardware clock is set to UTC or local time) from the _adjtime_ file, where *hwclock*(8) stores that information. This is the default.
+
+*--date* _timestamp_::
+Set the wakeup time to the value of the timestamp. Format of the timestamp can be any of the following:
+
+[cols=",",]
+|===
+|YYYYMMDDhhmmss |
+|YYYY-MM-DD hh:mm:ss |
+|YYYY-MM-DD hh:mm |(seconds will be set to 00)
+|YYYY-MM-DD |(time will be set to 00:00:00)
+|hh:mm:ss |(date will be set to today)
+|hh:mm |(date will be set to today, seconds to 00)
+|tomorrow |(time is set to 00:00:00)
+|+5min |
+|===
+
+*-d*, *--device* _device_::
+Use the specified _device_ instead of *rtc0* as realtime clock. This option is only relevant if your system has more than one RTC. You may specify *rtc1*, *rtc2*, ... here.
+
+*-l*, *--local*::
+Assume that the hardware clock is set to local time, regardless of the contents of the _adjtime_ file.
+
+*--list-modes*::
+List available *--mode* option arguments.
+
+*-m*, *--mode* _mode_::
+Go into the given standby state. Valid values for _mode_ are:
+
+*standby*;;
+ACPI state S1. This state offers minimal, though real, power savings, while providing a very low-latency transition back to a working system. This is the default mode.
+
+*freeze*;;
+The processes are frozen, all the devices are suspended and all the processors idled. This state is a general state that does not need any platform-specific support, but it saves less power than Suspend-to-RAM, because the system is still in a running state. (Available since Linux 3.9.)
+
+*mem*;;
+ACPI state S3 (Suspend-to-RAM). This state offers significant power savings as everything in the system is put into a low-power state, except for memory, which is placed in self-refresh mode to retain its contents.
+
+*disk*;;
+ACPI state S4 (Suspend-to-disk). This state offers the greatest power savings, and can be used even in the absence of low-level platform support for power management. This state operates similarly to Suspend-to-RAM, but includes a final step of writing memory contents to disk.
+
+*off*;;
+ACPI state S5 (Poweroff). This is done by calling '/sbin/shutdown'. Not officially supported by ACPI, but it usually works.
+
+*no*;;
+Don't suspend, only set the RTC wakeup time.
+
+*on*;;
+Don't suspend, but read the RTC device until an alarm time appears. This mode is useful for debugging.
+
+*disable*;;
+Disable a previously set alarm.
+
+*show*;;
+Print alarm information in format: "alarm: off|on <time>". The time is in ctime() output format, e.g., "alarm: on Tue Nov 16 04:48:45 2010".
+
+*-n*, *--dry-run*::
+This option does everything apart from actually setting up the alarm, suspending the system, or waiting for the alarm.
+
+*-s*, *--seconds* _seconds_::
+Set the wakeup time to _seconds_ in the future from now.
+
+*-t*, *--time* _time_t_::
+Set the wakeup time to the absolute time _time_t_. _time_t_ is the time in seconds since 1970-01-01, 00:00 UTC. Use the *date*(1) tool to convert between human-readable time and _time_t_.
+
+*-u*, *--utc*::
+Assume that the hardware clock is set to UTC (Universal Time Coordinated), regardless of the contents of the _adjtime_ file.
+
+*-v*, *--verbose*::
+Be verbose.
+
+include::man-common/help-version.adoc[]
+
+== NOTES
+
+Some PC systems can't currently exit sleep states such as *mem* using only the kernel code accessed by this driver. They need help from userspace code to make the framebuffer work again.
+
+== FILES
+
+_{ADJTIME_PATH}_
+
+== HISTORY
+
+The program was posted several times on LKML and other lists before appearing in kernel commit message for Linux 2.6 in the GIT commit 87ac84f42a7a580d0dd72ae31d6a5eb4bfe04c6d.
+
+== AUTHORS
+
+The program was written by mailto:dbrownell@users.sourceforge.net[David Brownell] and improved by mailto:bwalle@suse.de[Bernhard Walle].
+
+== COPYRIGHT
+
+This is free software. You may redistribute copies of it under the terms of the link:http://www.gnu.org/licenses/gpl.html[GNU General Public License]. There is NO WARRANTY, to the extent permitted by law.
+
+== SEE ALSO
+
+*adjtime_config*(5),
+*hwclock*(8),
+*date*(1)
+
+include::man-common/bugreports.adoc[]
+
+include::man-common/footer.adoc[]
+
+ifdef::translation[]
+include::man-common/translation.adoc[]
+endif::[]
-- 
cgit v1.2.3

