From d079b656b4719739b2247dcd9d46e9bec793095a Mon Sep 17 00:00:00 2001
From: Daniel Baumann <daniel.baumann@progress-linux.org>
Date: Mon, 6 Feb 2023 17:11:34 +0100
Subject: Merging upstream version 1.38.0.

Signed-off-by: Daniel Baumann <daniel.baumann@progress-linux.org>
---
 docs/dashboard/reference-web-server.mdx | 20 ++++++++++----------
 1 file changed, 10 insertions(+), 10 deletions(-)

(limited to 'docs/dashboard/reference-web-server.mdx')

diff --git a/docs/dashboard/reference-web-server.mdx b/docs/dashboard/reference-web-server.mdx
index 55e761a23..f90e6f873 100644
--- a/docs/dashboard/reference-web-server.mdx
+++ b/docs/dashboard/reference-web-server.mdx
@@ -16,7 +16,7 @@ This web server respects the `keep-alive` HTTP header to serve multiple HTTP req
 
 ## Configuration
 
-From within your Netdata config directory (typically `/etc/netdata`), [use `edit-config`](/docs/configure/nodes.md) to
+From within your Netdata config directory (typically `/etc/netdata`), [use `edit-config`](https://github.com/netdata/netdata/blob/master/docs/configure/nodes.md) to
 open `netdata.conf`.
 
 ```
@@ -33,8 +33,8 @@ Scroll down to the `[web]` section to find the following settings.
 | `ssl certificate`                          | `/etc/netdata/ssl/cert.pem`                                                                                                                                                            | Declare the location of an SSL certificate to [enable HTTPS](#enable-httpstls-support).                                                                                                                                                                                                                                                                                                                                                                                                           |
 | `tls version`                              | `1.3`                                                                                                                                                                                  | Choose which TLS version to use. While all versions are allowed (`1` or `1.0`, `1.1`, `1.2` and `1.3`), we recommend `1.3` for the most secure encryption. If left blank, Netdata uses the highest available protocol version on your system.                                                                                                                                                                                                                                                     |
 | `tls ciphers`                              | `none`                                                                                                                                                                                 | Choose which TLS cipher to use. Options include `TLS_AES_256_GCM_SHA384`, `TLS_CHACHA20_POLY1305_SHA256`, and `TLS_AES_128_GCM_SHA256`. If left blank, Netdata uses the default cipher list for that protocol provided by your TLS implementation.                                                                                                                                                                                                                                                |
-| `ses max window`                           | `15`                                                                                                                                                                                   | See [single exponential smoothing](/web/api/queries/ses/README.md).                                                                                                                                                                                                                                                                                                                                                                                                                               |
-| `des max window`                           | `15`                                                                                                                                                                                   | See [double exponential smoothing](/web/api/queries/des/README.md).                                                                                                                                                                                                                                                                                                                                                                                                                               |
+| `ses max window`                           | `15`                                                                                                                                                                                   | See [single exponential smoothing](https://github.com/netdata/netdata/blob/master/web/api/queries/ses/README.md).                                                                                                                                                                                                                                                                                                                                                                                                                               |
+| `des max window`                           | `15`                                                                                                                                                                                   | See [double exponential smoothing](https://github.com/netdata/netdata/blob/master/web/api/queries/des/README.md).                                                                                                                                                                                                                                                                                                                                                                                                                               |
 | `mode`                                     | `static-threaded`                                                                                                                                                                      | Turns on (`static-threaded` or off (`none`) the static-threaded web server. See the [example](#disable-the-web-server) to turn off the web server and disable the dashboard.                                                                                                                                                                                                                                                                                                                      |
 | `listen backlog`                           | `4096`                                                                                                                                                                                 | The port backlog. Check `man 2 listen`.                                                                                                                                                                                                                                                                                                                                                                                                                                                           |
 | `default port`                             | `19999`                                                                                                                                                                                | The listen port for the static web server.                                                                                                                                                                                                                                                                                                                                                                                                                                                        |
@@ -42,10 +42,10 @@ Scroll down to the `[web]` section to find the following settings.
 | `web files group`                          | `netdata`                                                                                                                                                                              | If this is set, Netdata will check if the file is owned by this group and refuse to serve the file if it's not.                                                                                                                                                                                                                                                                                                                                                                                   |
 | `disconnect idle clients after seconds`    | `60`                                                                                                                                                                                   | The time in seconds to disconnect web clients after being totally idle.                                                                                                                                                                                                                                                                                                                                                                                                                           |
 | `timeout for first request`                | `60`                                                                                                                                                                                   | How long to wait for a client to send a request before closing the socket. Prevents slow request attacks.                                                                                                                                                                                                                                                                                                                                                                                         |
-| `accept a streaming request every seconds` | `0`                                                                                                                                                                                    | Can be used to set a limit on how often a parent node will accept streaming requests from child nodes in a [streaming and replication setup](/streaming/README.md).                                                                                                                                                                                                                                                                                                                               |
-| `respect do not track policy`              | `no`                                                                                                                                                                                   | If set to `yes`, Netdata will respect the user's browser preferences for [Do Not Track](https://www.eff.org/issues/do-not-track) (DNT) and storing cookies. If DNT is _enabled_ in the browser, and this option is set to `yes`, users will not be able to sign in to Netdata Cloud via their local Agent dashboard, and their node will not connect to any [registry](/registry/README.md). For certain browsers, users must disable DNT and change this option to `yes` for full functionality. |
+| `accept a streaming request every seconds` | `0`                                                                                                                                                                                    | Can be used to set a limit on how often a parent node will accept streaming requests from child nodes in a [streaming and replication setup](https://github.com/netdata/netdata/blob/master/streaming/README.md).                                                                                                                                                                                                                                                                                                                               |
+| `respect do not track policy`              | `no`                                                                                                                                                                                   | If set to `yes`, Netdata will respect the user's browser preferences for [Do Not Track](https://www.eff.org/issues/do-not-track) (DNT) and storing cookies. If DNT is _enabled_ in the browser, and this option is set to `yes`, users will not be able to sign in to Netdata Cloud via their local Agent dashboard, and their node will not connect to any [registry](https://github.com/netdata/netdata/blob/master/registry/README.md). For certain browsers, users must disable DNT and change this option to `yes` for full functionality. |
 | `x-frame-options response header`          | ` `                                                                                                                                                                                    | Avoid [clickjacking attacks](https://developer.mozilla.org/en-US/docs/Web/HTTP/Headers/X-Frame-Options), by ensuring that the content is not embedded into other sites.                                                                                                                                                                                                                                                                                                                           |
-| `allow connections from`                   | `localhost *`                                                                                                                                                                          | Declare which IP addresses or full-qualified domain names (FQDNs) are allowed to connect to the web server, including the [dashboard](/docs/dashboard/interact-charts.mdx) or [HTTP API](/web/api/README.md). This is a global setting with higher priority to any of the ones below.                                                                                                                                                                                                             |
+| `allow connections from`                   | `localhost *`                                                                                                                                                                          | Declare which IP addresses or full-qualified domain names (FQDNs) are allowed to connect to the web server, including the [dashboard](https://github.com/netdata/netdata/blob/master/docs/dashboard/interact-charts.mdx) or [HTTP API](https://github.com/netdata/netdata/blob/master/web/api/README.md). This is a global setting with higher priority to any of the ones below.                                                                                                                                                                                                             |
 | `allow connections by dns`                 | `heuristic`                                                                                                                                                                            | See the [access list examples](#access-lists) for details on using `allow` settings.                                                                                                                                                                                                                                                                                                                                                                                                              |
 | `allow dashboard from`                     | `localhost *`                                                                                                                                                                          |                                                                                                                                                                                                                                                                                                                                                                                                                                                                                                   |
 | `allow dashboard by dns`                   | `heuristic`                                                                                                                                                                            |                                                                                                                                                                                                                                                                                                                                                                                                                                                                                                   |
@@ -62,7 +62,7 @@ Scroll down to the `[web]` section to find the following settings.
 | `gzip compression level`                   | `3`                                                                                                                                                                                    | Valid settings are 1 (fastest) to 9 (best ratio).                                                                                                                                                                                                                                                                                                                                                                                                                                                 |
 | `web server threads`                       | ` `                                                                                                                                                                                    | How many processor threads the web server is allowed. The default is system-specific, the minimum of `6` or the number of CPU cores.                                                                                                                                                                                                                                                                                                                                                              |
 | `web server max sockets`                   | ` `                                                                                                                                                                                    | Available sockets. The default is system-specific, automatically adjusted to 50% of the max number of open files Netdata is allowed to use (via `/etc/security/limits.conf` or systemd), to allow enough file descriptors to be available for data collection.                                                                                                                                                                                                                                    |
-| `custom dashboard_info.js`                 | ` `                                                                                                                                                                                    | Specifies the location of a custom `dashboard.js` file. See [customizing the standard dashboard](/docs/dashboard/customize.mdx#customize-the-standard-dashboard) for details.                                                                                                                                                                                                                                                                                                                     |
+| `custom dashboard_info.js`                 | ` `                                                                                                                                                                                    | Specifies the location of a custom `dashboard.js` file. See [customizing the standard dashboard](https://github.com/netdata/netdata/blob/master/docs/dashboard/customize.mdx#customize-the-standard-dashboard) for details.                                                                                                                                                                                                                                                                                                                     |
 
 ## Examples
 
@@ -102,7 +102,7 @@ Using the above, Netdata will bind to:
 -   IPv4 127.0.0.1 at port 19999 (port was used from `default port`). Only the UI (dashboard) and the read API will be accessible on this port. Both HTTP and HTTPS requests will be accepted.
 -   IPv4 10.1.1.1 at port 19998. The management API and `netdata.conf` will be accessible on this port.
 -   All the IPs `hostname` resolves to (both IPv4 and IPv6 depending on the resolved IPs) at port 19997. Only badges will be accessible on this port.
--   All IPv6 IPs at port 19996. Only metric streaming requests from other Netdata agents will be accepted on this port. Only encrypted streams will be allowed (i.e. child nodes also need to be [configured for TLS](/streaming/README.md).
+-   All IPv6 IPs at port 19996. Only metric streaming requests from other Netdata agents will be accepted on this port. Only encrypted streams will be allowed (i.e. child nodes also need to be [configured for TLS](https://github.com/netdata/netdata/blob/master/streaming/README.md).
 -   All the IPs `localhost` resolves to (both IPv4 and IPv6 depending the resolved IPs) at port 19996. This port will only accept registry API requests.
 -   All IPv4 and IPv6 IPs at port `http` as set in `/etc/services`. Only the UI (dashboard) and the read API will be accessible on this port. 
 -   Unix domain socket `/run/netdata/netdata.sock`. All requests are serviceable on this socket. Note that in some OSs like Fedora, every service sees a different `/tmp`, so don't create a Unix socket under `/tmp`. `/run` or `/var/run` is suggested.
@@ -189,7 +189,7 @@ Example:
     bind to = *=dashboard|registry|badges|management|streaming|netdata.conf^SSL=force
 ```
 
-For information how to configure the child to use TLS, check [securing the communication](/streaming/README.md#securing-streaming-communications) in the streaming documentation. There you will find additional details on the expected behavior for client and server nodes, when their respective TLS options are enabled.
+For information how to configure the child to use TLS, check [securing the communication](https://github.com/netdata/netdata/blob/master/streaming/README.md#securing-streaming-communications) in the streaming documentation. There you will find additional details on the expected behavior for client and server nodes, when their respective TLS options are enabled.
 
 When we define the use of SSL in a Netdata agent for different ports,  Netdata will apply the behavior specified on each port. For example, using the configuration line below:
 
@@ -245,7 +245,7 @@ Netdata supports access lists in `netdata.conf`:
 -   `allow netdata.conf from` checks the IP to allow `http://netdata.host:19999/netdata.conf`.
      The IPs listed are all the private IPv4 addresses, including link local IPv6 addresses. Keep in mind that connections to Netdata API ports are filtered by `allow connections from`. So, IPs allowed by `allow netdata.conf from` should also be allowed by `allow connections from`.
 
--   `allow management from` checks the IPs to allow API management calls. Management via the API is currently supported for [health](/web/api/health/README.md#health-management-api)
+-   `allow management from` checks the IPs to allow API management calls. Management via the API is currently supported for [health](https://github.com/netdata/netdata/blob/master/web/api/health/README.md#health-management-api)
 
 In order to check the FQDN of the connection without opening the Netdata agent to DNS-spoofing, a reverse-dns record
 must be setup for the connecting host. At connection time the reverse-dns of the peer IP address is resolved, and
-- 
cgit v1.2.3

